X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/96461cc29d03b4a7ab72abaae2e7edace93dd2a5..17bcb99892b5b424cc6888b1eecd34f5c37a16b4:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index c3f3866aea..4039407671 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -105,3 +105,4 @@ len or the size of the stream buffer.
 
 Returns the pointer to the stream object used as an internal buffer
 for that stream.
+
