X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..eb17eaba370e68c2c59f29e4e20de979bf4655f2:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 13160da737..924eb542d2 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -245,11 +245,14 @@ field must be -1. You should delete this array after calling {\bf SetStatusWidth
 \wxheading{Remarks}
 
 The widths of the variable fields are calculated from the total width of all fields,
-minus the sum of widths of the non-variable fields, divided by the number of 
+minus the sum of widths of the non-variable fields, divided by the number of
 variable fields.
 
 \wxheading{See also}
 
 \helpref{wxStatusBar::SetFieldsCount}{wxstatusbarsetfieldscount}, \helpref{wxFrame::SetStatusWidths}{wxframesetstatuswidths}
 
+\pythonnote{Only a single parameter is required, a Python list of
+integers.}
+
 
