X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..e195c8c95fb154d035bab400952fc81c62439549:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 13160da737..7c1c99b309 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -35,7 +35,7 @@ from an {\bf OnSize} event handler.
 
 \wxheading{See also}
 
-\helpref{wxFrame}{wxframe}
+\helpref{wxFrame}{wxframe}, \helpref{Status bar sample}{samplestatbar}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -204,6 +204,12 @@ and refreshes the window.
 
 Sets the number of fields, and optionally the field widths.
 
+\pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
+to set the widths of the fields.}
+
+\perlnote{In wxPerl this function acceps only the {\tt n} parameter.
+Use SetStatusWidths to set the field widths.}
+
 \wxheading{Parameters}
 
 \docparam{number}{The number of fields.}
@@ -212,6 +218,14 @@ Sets the number of fields, and optionally the field widths.
 in pixels. A value of -1 indicates that the field is variable width; at least one
 field must be -1.}
 
+\membersection{wxStatusBar::SetMinHeight}\label{wxstatusbarsetminheight}
+
+\func{void}{SetMinHeight}{\param{int}{ height}}
+
+Sets the minimal possible hight for the status bar. The real height may be
+bigger than the height specified here depending on the size of the font used by
+the status bar.
+
 \membersection{wxStatusBar::SetStatusText}\label{wxstatusbarsetstatustext}
 
 \func{virtual void}{SetStatusText}{\param{const wxString\& }{text}, \param{int}{ i = 0}}
@@ -245,11 +259,15 @@ field must be -1. You should delete this array after calling {\bf SetStatusWidth
 \wxheading{Remarks}
 
 The widths of the variable fields are calculated from the total width of all fields,
-minus the sum of widths of the non-variable fields, divided by the number of 
+minus the sum of widths of the non-variable fields, divided by the number of
 variable fields.
 
 \wxheading{See also}
 
 \helpref{wxStatusBar::SetFieldsCount}{wxstatusbarsetfieldscount}, \helpref{wxFrame::SetStatusWidths}{wxframesetstatuswidths}
 
+\pythonnote{Only a single parameter is required, a Python list of
+integers.}
+
+\perlnote{In wxPerl this method takes as parameters the field widths.}
 
