X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..dbddf573912254bb14b4ca70c5c5db6248051294:/docs/latex/wx/outptstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index eae660ae42..90873de8f9 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -3,6 +3,8 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxOutputStream}}\label{wxoutputstream}
 
+wxOutputStream is an abstract base class which may not be used directly.
+
 \wxheading{Derived from}
 
 \helpref{wxStreamBase}{wxstreambase}
@@ -11,10 +13,6 @@
 
 <wx/stream.h>
 
-\wxheading{See also}
-
-\helpref{wxStreamBuffer}{wxstreambuffer}
-
 % -----------
 % ctor & dtor
 % -----------
@@ -24,20 +22,18 @@
 
 Creates a dummy wxOutputStream object.
 
-\func{}{wxOutputStream}{\param{wxStreamBuffer*}{ sbuf}}
-
-Creates an input stream using the specified stream buffer \it{sbuf}. This
-stream buffer can point to another stream.
-
 \membersection{wxOutputStream::\destruct{wxOutputStream}}
 
 \func{}{\destruct{wxOutputStream}}{\void}
 
 Destructor.
 
-% -----------
-% IO function
-% -----------
+\membersection{wxOutputStream::LastWrite}
+
+\constfunc{size\_t}{LastWrite}{\void}
+
+Returns the number of bytes written during the last Write().
+
 \membersection{wxOutputStream::PutC}
 
 \func{void}{PutC}{\param{char}{ c}}
@@ -45,47 +41,75 @@ Destructor.
 Puts the specified character in the output queue and increments the
 stream position.
 
+\membersection{wxOutputStream::SeekO}
+
+\func{off\_t}{SeekO}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode}}
+
+Changes the stream current position.
+
+\membersection{wxOutputStream::TellO}
+
+\constfunc{off\_t}{TellO}{\void}
+
+Returns the current stream position.
+
 \membersection{wxOutputStream::Write}
 
-\func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size_t}{ size}}
+\func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size\_t}{ size}}
 
-Writes the specified amount of bytes using the data of \it{buffer}. 
-\it{WARNING!} The buffer absolutely needs to have at least the specified size.
+Writes the specified amount of bytes using the data of {\it buffer}. 
+{\it WARNING!} The buffer absolutely needs to have at least the specified size.
 
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
 
-\func{wxOutputStream\&}{Write}{\param{wxInputStream\&}{ stream_in}}
+\func{wxOutputStream\&}{Write}{\param{wxInputStream\&}{ stream\_in}}
 
 Reads data from the specified input stream and stores them 
 in the current stream. The data is read until an error is raised
 by one of the two streams.
 
-% ------------------
-% Position functions
-% ------------------
-\membersection{wxOutputStream::SeekO}
+% -----------------------------------------------------------------------------
+% wxCountingOutputStream
+% -----------------------------------------------------------------------------
+\section{\class{wxCountingOutputStream}}\label{wxcountingoutputstream}
 
-\func{off_t}{SeekO}{\param{off_t}{ pos}, \param{wxSeekMode}{ mode}}
+wxCountingOutputStream is specialized output stream which does not write any data anyway,
+instead it counts how many bytes would get written if this were a normal stream. This
+can sometimes be useful or required if some data gets serialized to a stream or compressed
+by using stream compression and thus the final size of the stream cannot be known other
+than pretending to write the stream. One case where the resulting size would have to be
+known is if the data has to be written to a piece of memory and the memory has to be
+allocated before writing to it (which is probably always the case when writing to a 
+memory stream).
 
-Changes the stream current position.
+\wxheading{Derived from}
 
-\membersection{wxOutputStream::TellO}
+\helpref{wxOutputStream}{wxoutputstream}
+\helpref{wxStreamBase}{wxstreambase}
 
-\constfunc{off_t}{TellO}{\void}
+\wxheading{Include files}
 
-Returns the current stream position.
+<wx/stream.h>
 
-% ---------------
-% State functions
-% ---------------
-\membersection{wxOutputStream::OutputStreamBuffer}
+% -----------
+% ctor & dtor
+% -----------
+\membersection{wxCountingOutputStream::wxCountingOutputStream}
 
-\func{wxStreamBuffer *}{OutputStreamBuffer}{\void}
+\func{}{wxCountingOutputStream}{\void}
 
-Returns the stream buffer associated with the output stream.
+Creates a wxCountingOutputStream object.
 
-\membersection{wxOutputStream::LastWrite}
+\membersection{wxCountingOutputStream::\destruct{wxCountingOutputStream}}
+
+\func{}{\destruct{wxCountingOutputStream}}{\void}
+
+Destructor.
+
+\membersection{wxCountingOutputStream::GetSize}
+
+\constfunc{size\_t}{GetSize}{\void}
 
-\constfunc{size_t}{LastWrite}{\void}
+Returns the current size of the stream.
 
