X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..d82323930c8ce1b800f2213a598fbda79f868d1d:/docs/latex/wx/database.tex?ds=inline

diff --git a/docs/latex/wx/database.tex b/docs/latex/wx/database.tex
index cc884b99d2..92c5c24936 100644
--- a/docs/latex/wx/database.tex
+++ b/docs/latex/wx/database.tex
@@ -3,6 +3,9 @@
 Every database object represents an ODBC connection.
 The connection may be closed and reopened.
 
+Note: this class is considered obsolete, replaced by the Remstar wxDB/wxTable classes
+(documented separately in Word and PDF format, as odbc.doc and odbc.pdf).
+
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
@@ -15,6 +18,12 @@ The connection may be closed and reopened.
 
 \overview{wxDatabase overview}{wxdatabaseoverview}, \helpref{wxRecordSet}{wxrecordset}
 
+A much more robust and feature-rich set of ODBC classes is now
+available and recommended for use in place of the wxDatabase class.
+
+See details of these classes in:
+\helpref{wxDB}{wxdb}, \helpref{wxTable}{wxtable}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxDatabase::wxDatabase}
@@ -71,9 +80,9 @@ and disconnects from the current data source.
 
 Commits previous transactions. Not implemented.
 
-\membersection{wxDatabase::ErrorOccured}
+\membersection{wxDatabase::ErrorOccurred}
 
-\func{bool}{ErrorOccured}{\void}
+\func{bool}{ErrorOccurred}{\void}
 
 Returns TRUE if the last action caused an error.
 
@@ -81,7 +90,7 @@ Returns TRUE if the last action caused an error.
 
 \func{void}{ErrorSnapshot}{\param{HSTMT}{ statement = SQL\_NULL\_HSTMT}}
 
-This function will be called whenever an ODBC error occured. It stores the
+This function will be called whenever an ODBC error occurred. It stores the
 error related information returned by ODBC. If a statement handle of the
 concerning ODBC action is available it should be passed to the function.
 
