X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..b2edef6f2f587d957eabbc17364382293707340f:/docs/latex/wx/view.tex

diff --git a/docs/latex/wx/view.tex b/docs/latex/wx/view.tex
index b988382746..77b0811952 100644
--- a/docs/latex/wx/view.tex
+++ b/docs/latex/wx/view.tex
@@ -43,7 +43,7 @@ variable when the view is created. Not currently used by the framework.
 
 \membersection{wxView::wxView}
 
-\func{}{wxView}{\param{wxDocument* }{doc = NULL}}
+\func{}{wxView}{\void}
 
 Constructor. Define your own default constructor to initialize application-specific
 data.
@@ -130,12 +130,14 @@ frame associated with the view.
 
 \func{virtual bool}{OnCreate}{\param{wxDocument* }{doc}, \param{long}{ flags}}
 
-Called just after view construction to give the view a chance to initialize
-itself based on the passed document and flags (unused). By default, simply
-returns TRUE. If the function returns FALSE, the view will be deleted.
+wxDocManager or wxDocument creates a wxView via a wxDocTemplate.
+Just after the wxDocTemplate creates the wxView, it calls
+wxView::OnCreate. In its OnCreate member function, the wxView can create a wxDocChildFrame
+or a derived class. This wxDocChildFrame provides user interface
+elements to view and/or edit the contents of the wxDocument.
 
-The predefined document child frame, wxDocChildFrame, calls this function
-automatically.
+By default, simply returns TRUE. If the function returns FALSE, the
+view will be deleted.
 
 \membersection{wxView::OnCreatePrintout}
 
