X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..b14391d1c8fde767eabedd2243dd6583f685f53f:/docs/latex/wx/imaglist.tex?ds=inline

diff --git a/docs/latex/wx/imaglist.tex b/docs/latex/wx/imaglist.tex
index aeab053604..149b343724 100644
--- a/docs/latex/wx/imaglist.tex
+++ b/docs/latex/wx/imaglist.tex
@@ -79,6 +79,14 @@ The new zero-based image index.
 
 The original bitmap or icon is not affected by the {\bf Add} operation, and can be deleted afterwards.
 
+\pythonnote{In place of a single overloaded method name, wxPython
+implements the following methods:\par
+\indented{2cm}{\begin{twocollist}
+\twocolitem{{\bf Add(bitmap, mask=wxNullBitmap)}}{}
+\twocolitem{{\bf AddWithColourMask(bitmap, colour)}}{}
+\twocolitem{{\bf AddIcon(icon)}}{}
+\end{twocollist}}
+}
 \membersection{wxImageList::Create}\label{wximagelistcreate}
 
 \func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
@@ -161,4 +169,6 @@ TRUE if the replacement was successful, FALSE otherwise.
 
 The original bitmap or icon is not affected by the {\bf Replace} operation, and can be deleted afterwards.
 
+\pythonnote{The second form is called {\tt ReplaceIcon} in wxPython.}
+
 
