X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..a8cb1d29e7fe349142d8d6be9fc9afe986340611:/docs/latex/wx/validatr.tex?ds=sidebyside

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index 2bbb2f7dd3..b6319b0a39 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -64,6 +64,13 @@ This base function returns NULL.
 
 Returns the window associated with the validator.
 
+\membersection{wxValidator::SetBellOnError}{wxvalidatorsetbellonerror}
+
+\func{void}{SetBellOnError}{\param{bool}{ doIt = TRUE}}
+
+This functions switches on or turns off the error sound produced by the
+validators if an invalid key is pressed.
+
 \membersection{wxValidator::SetWindow}\label{wxvalidatorsetwindow}
 
 \func{void}{SetWindow}{\param{wxWindow*}{ window}}
