X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..a84ece11fffdde5d1bbd254ba58ac3cee79c2e77:/docs/latex/wx/node.tex?ds=inline

diff --git a/docs/latex/wx/node.tex b/docs/latex/wx/node.tex
index 389c874644..c2b6600772 100644
--- a/docs/latex/wx/node.tex
+++ b/docs/latex/wx/node.tex
@@ -3,7 +3,7 @@
 A node structure used in linked lists (see \helpref{wxList}{wxlist}) and
 derived classes. You should never use wxNodeBase class directly because it
 works with untyped (void *) data and this is unsafe. Use wxNode-derived classes
-which are defined by WX\_DECLARE\_LIST and WX\_DEFIBE\_LIST macros instead as
+which are defined by WX\_DECLARE\_LIST and WX\_DEFINE\_LIST macros instead as
 described in \helpref{wxList}{wxlist} documentation (see example there). wxNode
 is defined for compatibility as wxNodeBase containing "wxObject *" pointer, but
 usage of this class is deprecated.
@@ -34,7 +34,7 @@ Retrieves the client data pointer associated with the node.
 
 Retrieves the next node (NULL if at end of list).
 
-\membersection{wxNodeBase::Previous}
+\membersection{wxNodeBase::GetPrevious}
 
 \func{wxNodeBase *}{GetPrevious}{\void}
 
