X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..93f467a3b4d1eda959b44cc01df34b4463383cfe:/docs/latex/wx/layalgor.tex

diff --git a/docs/latex/wx/layalgor.tex b/docs/latex/wx/layalgor.tex
index e4d58e3264..dc86bb2a1b 100644
--- a/docs/latex/wx/layalgor.tex
+++ b/docs/latex/wx/layalgor.tex
@@ -40,7 +40,7 @@ bottom of the remaining client area. This scheme implies that order of window cr
 Say you wish to have an extra toolbar at the top of the frame, a project window to the left of
 the MDI client window, and an output window above the status bar. You should therefore create
 the windows in this order: toolbar, output window, project window. This ensures that the toolbar and
-output window take up space at the top and bottom, and then the remaining height inbetween is used for
+output window take up space at the top and bottom, and then the remaining height in-between is used for
 the project window.
 
 wxLayoutAlgorithm is quite independent of the way in which
@@ -141,5 +141,8 @@ The MDI client window is set to occupy the remaining space.
 
 Lays out the children of a normal frame or other window.
 
-{\it mainWindow} is set to occupy the remaining space.
+{\it mainWindow} is set to occupy the remaining space. If this is not specified, then
+the last window that responds to a calculate layout event in query mode will get the remaining space
+(that is, a non-query OnCalculateLayout event will not be sent to this window and the window will be set
+to the remaining size).
 
