X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..8fa2e6a209ab83319bbc4d652067c9123deaa335:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index a4e872e328..e2ac776041 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -62,6 +62,13 @@ window is passed and the tool id is retrieved from the wxCommandEvent.
 This is because the id may be -1 when the mouse moves off a tool, and -1 is not
 allowed as an identifier in the event system.
 
+Note that tool commands (and UI update events for tools) are first sent to
+the focus window within the frame that contains the toolbar. If no window within the frame has the focus,
+then the events are sent directly to the toolbar (and up the hierarchy to the
+frame, depending on where the application has put its event handlers). This allows command and UI update
+handling to be processed by specific windows and controls, and not necessarily
+by the application frame.
+
 \twocolwidtha{7cm}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{{\bf EVT\_TOOL(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_CLICKED event
@@ -303,17 +310,11 @@ Returns the left/right and top/bottom margins, which are also used for inter-too
 
 \membersection{wxToolBar::GetMaxSize}\label{wxtoolbargetmaxsize}
 
-\constfunc{void}{GetMaxSize}{\param{float*}{ w}, \param{float*}{ h}}
+\constfunc{wxSize}{GetMaxSize}{\void}
 
 Gets the maximum size taken up by the tools after layout, including margins.
 This can be used to size a frame around the toolbar window.
 
-\wxheading{Parameters}
-
-\docparam{w}{Receives the maximum horizontal size.}
-
-\docparam{h}{Receives the maximum vertical size.}
-
 \membersection{wxToolBar::GetToolClientData}\label{wxtoolbargettoolclientdata}
 
 \constfunc{wxObject*}{GetToolClientData}{\param{int }{toolIndex}}
