X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..8bb8ab39dd433191764a64b4f96344399b113d1b:/docs/latex/wx/button.tex

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index be87dacb31..7bac1a1118 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -99,6 +99,14 @@ The button's label.
 
 \helpref{wxButton::SetLabel}{wxbuttonsetlabel}
 
+\membersection{wxButton::GetDefaultSize}\label{wxbuttongetdefaultsize}
+
+\func{wxSize}{GetDefaultSize}{\void}
+
+Returns the default size for the buttons. It is advised to make all the dialog
+buttons of the same size and this function allows to retrieve the (platform and
+current font dependent size) which should be the best suited for this.
+
 \membersection{wxButton::SetDefault}\label{wxbuttonsetdefault}
 
 \func{void}{SetDefault}{\void}
