X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..76e1c2debfe9558f79ab7c6cd2be1afc8b9d42c1:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index 20cf2e72d2..95e166b23a 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -34,10 +34,11 @@ can call directly wxStreamBuffer::Read without any problems.
 \wxheading{Warning}
 
 All errors and messages linked to the stream are stored in the stream object.
+
 \begin{verbatim}
-   streambuffer.Read(...);
-   streambuffer2.Read(...); /* This one erases previous error messages set by 
-                               ``streambuffer'' */
+  streambuffer.Read(...);
+  streambuffer2.Read(...); /* This one erases previous error messages set by 
+                              ``streambuffer'' */
 \end{verbatim}
 
 \func{}{wxStreamBuffer}{\param{BufMode}{ mode}}
@@ -114,7 +115,7 @@ It returns the real read size. If returned size is different of the specified
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer::WriteBack}{wxstreambufferwriteback}
+\helpref{wxStreamBuffer::Write}{wxstreambufferwrite}
 
 \func{size\_t}{Read}{\param{wxStreamBuffer *}{buffer}}
 
@@ -132,25 +133,6 @@ are cached in a buffer before being sent in one block to the stream.
 
 See \helpref{Read}{wxstreambufferread}.
 
-\membersection{wxStreamBuffer::WriteBack}\label{wxstreambufferwriteback}
-
-\func{size\_t}{WriteBack}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
-
-This function is only useful in \it{read} mode. It is the manager of the "Write-Back"
-buffer. This buffer acts like a temporary buffer where datas which has to be 
-read during the next read IO call are put. This is useful when you get a big
-block of data which you didn't want to read: you can replace them at the top
-of the input queue by this way.
-
-\wxheading{Return value}
-
-Returns the amount of bytes saved in the Write-Back buffer.
-
-\func{size\_t}{WriteBack}{\param{char }{c}}
-
-This function acts like the previous one except that it takes only one
-character: it is sometimes shorter to use than the generic function.
-
 \membersection{wxStreamBuffer::GetChar}
 
 \func{char}{GetChar}{\void}
