X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..762e199741e236841278dfa6c08a7a0ca376252e:/docs/latex/wx/ddeconn.tex

diff --git a/docs/latex/wx/ddeconn.tex b/docs/latex/wx/ddeconn.tex
index 0be17834bc..1436df1220 100644
--- a/docs/latex/wx/ddeconn.tex
+++ b/docs/latex/wx/ddeconn.tex
@@ -199,4 +199,3 @@ Called by the client application to ask if an advise loop can be
 stopped. Causes the server connection's \helpref{wxDDEConnection::OnStopAdvise}{wxddeconnectiononstopadvise} member
 to be called. Returns TRUE if the server okays it, FALSE otherwise.
 
-
