X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..6cf7c00f3beb3aa6c84b47d43d904e0e40f91a97:/docs/latex/wx/outptstr.tex

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index eae660ae42..74378c89b6 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -35,57 +35,48 @@ stream buffer can point to another stream.
 
 Destructor.
 
-% -----------
-% IO function
-% -----------
-\membersection{wxOutputStream::PutC}
-
-\func{void}{PutC}{\param{char}{ c}}
+\membersection{wxOutputStream::OutputStreamBuffer}
 
-Puts the specified character in the output queue and increments the
-stream position.
+\func{wxStreamBuffer *}{OutputStreamBuffer}{\void}
 
-\membersection{wxOutputStream::Write}
+Returns the stream buffer associated with the output stream.
 
-\func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size_t}{ size}}
+\membersection{wxOutputStream::LastWrite}
 
-Writes the specified amount of bytes using the data of \it{buffer}. 
-\it{WARNING!} The buffer absolutely needs to have at least the specified size.
+\constfunc{size\_t}{LastWrite}{\void}
 
-This function returns a reference on the current object, so the user can test
-any states of the stream right away.
+\membersection{wxOutputStream::PutC}
 
-\func{wxOutputStream\&}{Write}{\param{wxInputStream\&}{ stream_in}}
+\func{void}{PutC}{\param{char}{ c}}
 
-Reads data from the specified input stream and stores them 
-in the current stream. The data is read until an error is raised
-by one of the two streams.
+Puts the specified character in the output queue and increments the
+stream position.
 
-% ------------------
-% Position functions
-% ------------------
 \membersection{wxOutputStream::SeekO}
 
-\func{off_t}{SeekO}{\param{off_t}{ pos}, \param{wxSeekMode}{ mode}}
+\func{off\_t}{SeekO}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode}}
 
 Changes the stream current position.
 
 \membersection{wxOutputStream::TellO}
 
-\constfunc{off_t}{TellO}{\void}
+\constfunc{off\_t}{TellO}{\void}
 
 Returns the current stream position.
 
-% ---------------
-% State functions
-% ---------------
-\membersection{wxOutputStream::OutputStreamBuffer}
+\membersection{wxOutputStream::Write}
 
-\func{wxStreamBuffer *}{OutputStreamBuffer}{\void}
+\func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size\_t}{ size}}
 
-Returns the stream buffer associated with the output stream.
+Writes the specified amount of bytes using the data of \it{buffer}. 
+\it{WARNING!} The buffer absolutely needs to have at least the specified size.
 
-\membersection{wxOutputStream::LastWrite}
+This function returns a reference on the current object, so the user can test
+any states of the stream right away.
 
-\constfunc{size_t}{LastWrite}{\void}
+\func{wxOutputStream\&}{Write}{\param{wxInputStream\&}{ stream\_in}}
+
+Reads data from the specified input stream and stores them 
+in the current stream. The data is read until an error is raised
+by one of the two streams.
 
