X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..6217b9aa7eec987c5177ad1300a0847b77c1abb5:/docs/latex/wx/ddeservr.tex

diff --git a/docs/latex/wx/ddeservr.tex b/docs/latex/wx/ddeservr.tex
index 700632f3c3..44ae694b29 100644
--- a/docs/latex/wx/ddeservr.tex
+++ b/docs/latex/wx/ddeservr.tex
@@ -33,7 +33,7 @@ Constructs a server object.
 
 Registers the server using the given service name. Under UNIX, the
 string must contain an integer id which is used as an Internet port
-number. FALSE is returned if the call failed (for example, the port
+number. false is returned if the call failed (for example, the port
 number is already in use).
 
 \membersection{wxDDEServer::OnAcceptConnection}\label{wxddeserveronacceptconnection}
@@ -49,4 +49,3 @@ Under UNIX, when a server is created the OnAcceptConnection message is
 always sent for standard input and output, but in the context of DDE
 messages it doesn't make a lot of sense.
 
-
