X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..60a67569bf1bbcbc4d38c86ec30bb69613ecee92:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 5ef89d04d2..2882173e62 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -68,6 +68,9 @@ Returns a system colour.
 \twocolitem{{\bf wxSYS\_COLOUR\_BTNHILIGHT}}{Same as wxSYS\_COLOUR\_BTNHIGHLIGHT.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named \tt{wxSystemSettings_GetSystemColour}}
+
 \membersection{wxSystemSettings::GetSystemFont}\label{wxsystemsettingsgetsystemfont}
 
 \func{static wxFont}{GetSystemFont}{\param{int}{ index}}
@@ -87,6 +90,9 @@ Returns a system font.
 Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named \tt{wxSystemSettings_GetSystemFont}}
+
 \membersection{wxSystemSettings::GetSystemMetric}\label{wxsystemsettingsgetsystemmetric}
 
 \func{static int}{GetSystemMetric}{\param{int}{ index}}
@@ -143,3 +149,6 @@ where it would otherwise present the information only in audible form; zero othe
 \twocolitem{{\bf wxSYS\_SWAP\_BUTTONS}}{Non-zero if the meanings of the left and right mouse buttons are swapped; zero otherwise.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named \tt{wxSystemSettings_GetSystemMetric}}
+
