X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..5d9dba5b1a3a9072b8f9a2789ab39e11f193940d:/docs/latex/wx/postscpt.tex?ds=inline

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index c1d5e45eb1..425d22d4e7 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -15,6 +15,10 @@ descriptions of the member functions.
 
 \membersection{wxPostScriptDC::wxPostScriptDC}
 
+\func{}{wxPostScriptDC}{\param{const wxPrintData\&}{ printData}}
+
+Constructs a PostScript printer device context from a \helpref{wxPrintData}{wxprintdata} object.
+
 \func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = TRUE},\\
   \param{wxWindow *}{parent}}
 
@@ -28,11 +32,8 @@ in creating a useable device context.
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
 
-\membersection{wxPostScriptDC::GetStream}
-
-\func{ostream *}{GetStream}{\void}
+This constructor and the global printer settings are now deprecated;
+use the wxPrintData constructor instead.
 
-Returns the stream currently being used to write PostScript output. Use this
-to insert any PostScript code that is outside the scope of wxPostScriptDC.
 
 
