X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..5949fba636b73fad062a91764e486e658376c7d1:/docs/latex/wx/gauge.tex

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index a6b2336e9f..b3c01d4745 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -7,7 +7,7 @@ There are no user commands for the gauge.
 
 \helpref{wxControl}{wxcontrol}\\
 \helpref{wxWindow}{wxwindow}\\
-\helpref{wxEvtHandler}{wxEvtHandler}\\
+\helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
 \wxheading{Include files}
@@ -21,6 +21,7 @@ There are no user commands for the gauge.
 \twocolitem{\windowstyle{wxGA\_HORIZONTAL}}{Creates a horizontal gauge.}
 \twocolitem{\windowstyle{wxGA\_VERTICAL}}{Creates a vertical gauge.}
 \twocolitem{\windowstyle{wxGA\_PROGRESSBAR}}{Under Windows 95, creates a horizontal progress bar.}
+\twocolitem{\windowstyle{wxGA\_SMOOTH}}{Under Windows 95, creates smooth progress bar with one pixel wide update step.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
