X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..45fcbf3b7a7c9cfd96e67278e4eaa12e8e015651:/docs/latex/wx/checkbox.tex

diff --git a/docs/latex/wx/checkbox.tex b/docs/latex/wx/checkbox.tex
index 0f76ec31f3..396a731764 100644
--- a/docs/latex/wx/checkbox.tex
+++ b/docs/latex/wx/checkbox.tex
@@ -99,7 +99,8 @@ Returns TRUE if it is checked, FALSE otherwise.
 
 \func{void}{SetValue}{\param{const bool}{ state}}
 
-Sets the checkbox to the given state.
+Sets the checkbox to the given state. This does not cause a
+wxEVT\_COMMAND\_CHECKBOX\_CLICKED event to get emitted.
 
 \wxheading{Parameters}
 
