X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..3f3e668e3e3ca95f214f4f8ec0c3e1f21a94e6b5:/docs/latex/wx/critsect.tex

diff --git a/docs/latex/wx/critsect.tex b/docs/latex/wx/critsect.tex
index 74c987e7f8..0851745cd8 100644
--- a/docs/latex/wx/critsect.tex
+++ b/docs/latex/wx/critsect.tex
@@ -1,6 +1,6 @@
 \section{\class{wxCriticalSection}}\label{wxcriticalsection}
 
-A critical section object is used exactly for the same purpose as 
+A critical section object is used for the same exactly purpose as 
 \helpref{mutexes}{wxMutex}. The only difference is that under Windows platform
 critical sections are only visible inside one process, while mutexes may be
 shared between processes, so using critical sections is slightly more
