X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..21977bac1ae09f726d1437b1b7092ae5b3f99119:/docs/latex/wx/critsect.tex

diff --git a/docs/latex/wx/critsect.tex b/docs/latex/wx/critsect.tex
index 74c987e7f8..d2c67ee3df 100644
--- a/docs/latex/wx/critsect.tex
+++ b/docs/latex/wx/critsect.tex
@@ -1,7 +1,7 @@
 \section{\class{wxCriticalSection}}\label{wxcriticalsection}
 
-A critical section object is used exactly for the same purpose as 
-\helpref{mutexes}{wxMutex}. The only difference is that under Windows platform
+A critical section object is used for the same exactly purpose as 
+\helpref{mutexes}{wxmutex}. The only difference is that under Windows platform
 critical sections are only visible inside one process, while mutexes may be
 shared between processes, so using critical sections is slightly more
 efficient. The terminology is also slightly different: mutex may be locked (or
