X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..12ac619f42b81420980aec14afc9433af6f911dc:/docs/latex/wx/print.tex?ds=sidebyside

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index f576dd3f8e..e87acae4b5 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -1,6 +1,10 @@
 \section{\class{wxPrintData}}\label{wxprintdata}
 
-This class holds a variety of information related to print dialogs.
+This class holds a variety of information related to printers and
+printer device contexts. This class is used to create a wxPrinterDC
+and a wxPostScriptDC. It is also used as a data member of wxPrintDialogData
+and wxPageSetupDialogData, as part of the mechanism for transferring data
+between the print dialogs and the application.
 
 \wxheading{Derived from}
 
@@ -12,7 +16,45 @@ This class holds a variety of information related to print dialogs.
 
 \wxheading{See also}
 
-\helpref{wxPrintDialog}{wxprintdialog}, \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
+\helpref{wxPrintDialog}{wxprintdialog}, 
+\helpref{wxPageSetupDialog}{wxpagesetupdialog}, 
+\helpref{wxPrintDialogData}{wxprintdialogdata}, 
+\helpref{wxPageSetupDialogData}{wxpagesetupdialogdata}, 
+\helpref{wxPrintDialog Overview}{wxprintdialogoverview}, 
+\helpref{wxPrinterDC}{wxprinterdc}, 
+\helpref{wxPostScriptDC}{wxpostscriptdc}
+
+\wxheading{Remarks}
+
+The following functions are specific to PostScript printing
+and have not yet been documented:
+
+\begin{verbatim}
+const wxString& GetPrinterCommand() const ;
+const wxString& GetPrinterOptions() const ;
+const wxString& GetPreviewCommand() const ;
+const wxString& GetFilename() const ;
+const wxString& GetFontMetricPath() const ;
+double GetPrinterScaleX() const ;
+double GetPrinterScaleY() const ;
+long GetPrinterTranslateX() const ;
+long GetPrinterTranslateY() const ;
+// wxPRINT_MODE_PREVIEW, wxPRINT_MODE_FILE, wxPRINT_MODE_PRINTER
+wxPrintMode GetPrintMode() const ;
+
+void SetPrinterCommand(const wxString& command) ;
+void SetPrinterOptions(const wxString& options) ;
+void SetPreviewCommand(const wxString& command) ;
+void SetFilename(const wxString& filename) ;
+void SetFontMetricPath(const wxString& path) ;
+void SetPrinterScaleX(double x) ;
+void SetPrinterScaleY(double y) ;
+void SetPrinterScaling(double x, double y) ;
+void SetPrinterTranslateX(long x) ;
+void SetPrinterTranslateY(long y) ;
+void SetPrinterTranslation(long x, long y) ;
+void SetPrintMode(wxPrintMode printMode) ;
+\end{verbatim}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -20,7 +62,11 @@ This class holds a variety of information related to print dialogs.
 
 \func{}{wxPrintData}{\void}
 
-Constructor.
+Default constructor.
+
+\func{}{wxPrintData}{\param{const wxPrintData\&}{ data}}
+
+Copy constructor.
 
 \membersection{wxPrintData::\destruct{wxPrintData}}
 
@@ -28,135 +74,221 @@ Constructor.
 
 Destructor.
 
-\membersection{wxPrintData::EnableHelp}\label{wxprintdataenablehelp}
-
-\func{void}{EnableHelp}{\param{bool }{flag}}
-
-Enables or disables the `Help' button.
-
-\membersection{wxPrintData::EnablePageNumbers}\label{wxprintdataenablepagenumbers}
-
-\func{void}{EnablePageNumbers}{\param{bool }{flag}}
-
-Enables or disables the `Page numbers' controls.
-
-\membersection{wxPrintData::EnablePrintToFile}\label{wxprintdataenableprinttofile}
-
-\func{void}{EnablePrintToFile}{\param{bool }{flag}}
-
-Enables or disables the `Print to file' checkbox.
-
-\membersection{wxPrintData::EnableSelection}\label{wxprintdataenableselection}
-
-\func{void}{EnableSelection}{\param{bool }{flag}}
-
-Enables or disables the `Selection' radio button.
-
-\membersection{wxPrintData::GetAllPages}\label{wxprintdatagetallpages}
-
-\func{bool}{GetAllPages}{\void}
-
-Returns TRUE if the user requested that all pages be printed.
-
 \membersection{wxPrintData::GetCollate}\label{wxprintdatagetcollate}
 
-\func{bool}{GetCollate}{\void}
+\constfunc{bool}{GetCollate}{\void}
 
-Returns TRUE if the user requested that the document(s) be collated.
+Returns true if collation is on.
 
-\membersection{wxPrintData::GetFromPage}\label{wxprintdatagetfrompage}
+\membersection{wxPrintData::GetColour}\label{wxprintdatagetcolour}
 
-\func{int}{GetFromPage}{\void}
+\constfunc{bool}{GetColour}{\void}
 
-Returns the {\it from} page number, as entered by the user.
+Returns true if colour printing is on.
 
-\membersection{wxPrintData::GetMaxPage}\label{wxprintdatagetmaxpage}
+\membersection{wxPrintData::GetDuplex}\label{wxprintdatagetduplex}
 
-\func{int}{GetMaxPage}{\void}
-
-Returns the {\it maximum} page number.
+\constfunc{wxDuplexMode}{GetDuplex}{\void}
 
-\membersection{wxPrintData::GetMinPage}\label{wxprintdatagetminpage}
-
-\func{int}{GetMinPage}{\void}
-
-Returns the {\it minimum} page number.
+Returns the duplex mode. One of wxDUPLEX\_SIMPLEX, wxDUPLEX\_HORIZONTAL, wxDUPLEX\_VERTICAL.
 
 \membersection{wxPrintData::GetNoCopies}\label{wxprintdatagetnocopies}
 
-\func{int}{GetNoCopies}{\void}
+\constfunc{int}{GetNoCopies}{\void}
 
 Returns the number of copies requested by the user.
 
 \membersection{wxPrintData::GetOrientation}\label{wxprintdatagetorientation}
 
-\func{int}{GetOrientation}{\void}
+\constfunc{int}{GetOrientation}{\void}
 
 Gets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
 
-\membersection{wxPrintData::GetToPage}\label{wxprintdatagettopage}
+\membersection{wxPrintData::GetPaperId}\label{wxprintdatagetpaperid}
 
-\func{int}{GetToPage}{\void}
+\constfunc{wxPaperSize}{GetPaperId}{\void}
 
-Returns the {\it to} page number, as entered by the user.
+Returns the paper size id. For more information, see \helpref{wxPrintData::SetPaperId}{wxprintdatasetpaperid}.
 
-\membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
+\membersection{wxPrintData::GetPrinterName}\label{wxprintdatagetprintername}
 
-\func{void}{SetCollate}{\param{bool }{flag}}
+\constfunc{const wxString\&}{GetPrinterName}{\void}
 
-Sets the 'Collate' checkbox to TRUE or FALSE.
+Returns the printer name. If the printer name is the empty string, it indicates that the default
+printer should be used.
 
-\membersection{wxPrintData::SetFromPage}\label{wxprintdatasetfrompage}
+\membersection{wxPrintData::GetQuality}\label{wxprintdatagetquality}
 
-\func{void}{SetFromPage}{\param{int }{page}}
+\constfunc{wxPrintQuality}{GetQuality}{\void}
 
-Sets the {\it from} page number.
+Returns the current print quality. This can be a positive integer, denoting the number of dots per inch, or
+one of the following identifiers:
 
-\membersection{wxPrintData::SetMaxPage}\label{wxprintdatasetmaxpage}
+\begin{verbatim}
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
+\end{verbatim}
 
-\func{void}{SetMaxPage}{\param{int }{page}}
+On input you should pass one of these identifiers, but on return you may get back a positive integer
+indicating the current resolution setting.
 
-Sets the {\it maximum} page number.
+\membersection{wxPrintData::Ok}\label{wxprintdataok}
 
-\membersection{wxPrintData::SetMinPage}\label{wxprintdatasetminpage}
+\constfunc{bool}{Ok}{\void}
 
-\func{void}{SetMinPage}{\param{int }{page}}
+Returns true if the print data is valid for using in print dialogs.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
 
-Sets the {\it minimum} page number.
-
-\membersection{wxPrintData::SetOrientation}\label{wxprintdatasetorientation}
+\membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
 
-\func{void}{SetOrientation}{\param{int }{orientation}}
+\func{void}{SetCollate}{\param{bool }{flag}}
 
-Sets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
+Sets collation to on or off.
 
-\membersection{wxPrintData::SetNoCopies}\label{wxprintdatasetnocopies}
+\membersection{wxPrintData::SetColour}\label{wxprintdatasetcolour}
 
-\func{void}{SetNoCopies}{\param{int }{n}}
+\func{void}{SetColour}{\param{bool }{flag}}
 
-Sets the default number of copies to be printed out.
+Sets colour printing on or off.
 
-\membersection{wxPrintData::SetPrintToFile}\label{wxprintdatasetprinttofile}
+\membersection{wxPrintData::SetDuplex}\label{wxprintdatasetduplex}
 
-\func{void}{SetPrintToFile}{\param{bool }{flag}}
+\func{void}{SetDuplex}{\param{wxDuplexMode}{ mode}}
 
-Sets the 'Print to file' checkbox to TRUE or FALSE.
+Returns the duplex mode. One of wxDUPLEX\_SIMPLEX, wxDUPLEX\_HORIZONTAL, wxDUPLEX\_VERTICAL.
 
-\membersection{wxPrintData::SetSetupDialog}\label{wxprintdatasetsetupdialog}
+\membersection{wxPrintData::SetNoCopies}\label{wxprintdatasetnocopies}
 
-\func{void}{SetSetupDialog}{\param{bool }{flag}}
+\func{void}{SetNoCopies}{\param{int }{n}}
 
-Determines whether the dialog to be shown will be the Print dialog
-(pass FALSE) or Print Setup dialog (pass TRUE).
+Sets the default number of copies to be printed out.
 
-Note that the setup dialog is obsolete from
-Windows 95, though retained for backward compatibility.
+\membersection{wxPrintData::SetOrientation}\label{wxprintdatasetorientation}
 
-\membersection{wxPrintData::SetToPage}\label{wxprintdatasettopage}
+\func{void}{SetOrientation}{\param{int }{orientation}}
 
-\func{void}{SetToPage}{\param{int }{page}}
+Sets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
 
-Sets the {\it to} page number.
+\membersection{wxPrintData::SetPaperId}\label{wxprintdatasetpaperid}
+
+\func{void}{SetPaperId}{\param{wxPaperSize}{ paperId}}
+
+\index{wxPaperSize}Sets the paper id. This indicates the type of paper to be used. For a mapping between
+paper id, paper size and string name, see wxPrintPaperDatabase in {\tt paper.h} (not yet documented).
+
+{\it paperId} can be one of:
+
+{\small
+\begin{verbatim}
+    wxPAPER_NONE,               // Use specific dimensions
+    wxPAPER_LETTER,             // Letter, 8 1/2 by 11 inches
+    wxPAPER_LEGAL,              // Legal, 8 1/2 by 14 inches
+    wxPAPER_A4,                 // A4 Sheet, 210 by 297 millimeters
+    wxPAPER_CSHEET,             // C Sheet, 17 by 22 inches
+    wxPAPER_DSHEET,             // D Sheet, 22 by 34 inches
+    wxPAPER_ESHEET,             // E Sheet, 34 by 44 inches
+    wxPAPER_LETTERSMALL,        // Letter Small, 8 1/2 by 11 inches
+    wxPAPER_TABLOID,            // Tabloid, 11 by 17 inches
+    wxPAPER_LEDGER,             // Ledger, 17 by 11 inches
+    wxPAPER_STATEMENT,          // Statement, 5 1/2 by 8 1/2 inches
+    wxPAPER_EXECUTIVE,          // Executive, 7 1/4 by 10 1/2 inches
+    wxPAPER_A3,                 // A3 sheet, 297 by 420 millimeters
+    wxPAPER_A4SMALL,            // A4 small sheet, 210 by 297 millimeters
+    wxPAPER_A5,                 // A5 sheet, 148 by 210 millimeters
+    wxPAPER_B4,                 // B4 sheet, 250 by 354 millimeters
+    wxPAPER_B5,                 // B5 sheet, 182-by-257-millimeter paper
+    wxPAPER_FOLIO,              // Folio, 8-1/2-by-13-inch paper
+    wxPAPER_QUARTO,             // Quarto, 215-by-275-millimeter paper
+    wxPAPER_10X14,              // 10-by-14-inch sheet
+    wxPAPER_11X17,              // 11-by-17-inch sheet
+    wxPAPER_NOTE,               // Note, 8 1/2 by 11 inches
+    wxPAPER_ENV_9,              // #9 Envelope, 3 7/8 by 8 7/8 inches
+    wxPAPER_ENV_10,             // #10 Envelope, 4 1/8 by 9 1/2 inches
+    wxPAPER_ENV_11,             // #11 Envelope, 4 1/2 by 10 3/8 inches
+    wxPAPER_ENV_12,             // #12 Envelope, 4 3/4 by 11 inches
+    wxPAPER_ENV_14,             // #14 Envelope, 5 by 11 1/2 inches
+    wxPAPER_ENV_DL,             // DL Envelope, 110 by 220 millimeters
+    wxPAPER_ENV_C5,             // C5 Envelope, 162 by 229 millimeters
+    wxPAPER_ENV_C3,             // C3 Envelope, 324 by 458 millimeters
+    wxPAPER_ENV_C4,             // C4 Envelope, 229 by 324 millimeters
+    wxPAPER_ENV_C6,             // C6 Envelope, 114 by 162 millimeters
+    wxPAPER_ENV_C65,            // C65 Envelope, 114 by 229 millimeters
+    wxPAPER_ENV_B4,             // B4 Envelope, 250 by 353 millimeters
+    wxPAPER_ENV_B5,             // B5 Envelope, 176 by 250 millimeters
+    wxPAPER_ENV_B6,             // B6 Envelope, 176 by 125 millimeters
+    wxPAPER_ENV_ITALY,          // Italy Envelope, 110 by 230 millimeters
+    wxPAPER_ENV_MONARCH,        // Monarch Envelope, 3 7/8 by 7 1/2 inches
+    wxPAPER_ENV_PERSONAL,       // 6 3/4 Envelope, 3 5/8 by 6 1/2 inches
+    wxPAPER_FANFOLD_US,         // US Std Fanfold, 14 7/8 by 11 inches
+    wxPAPER_FANFOLD_STD_GERMAN, // German Std Fanfold, 8 1/2 by 12 inches
+    wxPAPER_FANFOLD_LGL_GERMAN, // German Legal Fanfold, 8 1/2 by 13 inches
+
+Windows 95 only:
+    wxPAPER_ISO_B4,             // B4 (ISO) 250 x 353 mm
+    wxPAPER_JAPANESE_POSTCARD,  // Japanese Postcard 100 x 148 mm
+    wxPAPER_9X11,               // 9 x 11 in
+    wxPAPER_10X11,              // 10 x 11 in
+    wxPAPER_15X11,              // 15 x 11 in
+    wxPAPER_ENV_INVITE,         // Envelope Invite 220 x 220 mm
+    wxPAPER_LETTER_EXTRA,       // Letter Extra 9 \275 x 12 in
+    wxPAPER_LEGAL_EXTRA,        // Legal Extra 9 \275 x 15 in
+    wxPAPER_TABLOID_EXTRA,      // Tabloid Extra 11.69 x 18 in
+    wxPAPER_A4_EXTRA,           // A4 Extra 9.27 x 12.69 in
+    wxPAPER_LETTER_TRANSVERSE,  // Letter Transverse 8 \275 x 11 in
+    wxPAPER_A4_TRANSVERSE,      // A4 Transverse 210 x 297 mm
+    wxPAPER_LETTER_EXTRA_TRANSVERSE, // Letter Extra Transverse 9\275 x 12 in
+    wxPAPER_A_PLUS,             // SuperA/SuperA/A4 227 x 356 mm
+    wxPAPER_B_PLUS,             // SuperB/SuperB/A3 305 x 487 mm
+    wxPAPER_LETTER_PLUS,        // Letter Plus 8.5 x 12.69 in
+    wxPAPER_A4_PLUS,            // A4 Plus 210 x 330 mm
+    wxPAPER_A5_TRANSVERSE,      // A5 Transverse 148 x 210 mm
+    wxPAPER_B5_TRANSVERSE,      // B5 (JIS) Transverse 182 x 257 mm
+    wxPAPER_A3_EXTRA,           // A3 Extra 322 x 445 mm
+    wxPAPER_A5_EXTRA,           // A5 Extra 174 x 235 mm
+    wxPAPER_B5_EXTRA,           // B5 (ISO) Extra 201 x 276 mm
+    wxPAPER_A2,                 // A2 420 x 594 mm
+    wxPAPER_A3_TRANSVERSE,      // A3 Transverse 297 x 420 mm
+    wxPAPER_A3_EXTRA_TRANSVERSE // A3 Extra Transverse 322 x 445 mm
+\end{verbatim}
+}
+
+\membersection{wxPrintData::SetPrinterName}\label{wxprintdatasetprintername}
+
+\func{void}{SetPrinterName}{\param{const wxString\& }{printerName}}
+
+Sets the printer name. This can be the empty string to indicate that the default
+printer should be used.
+
+\membersection{wxPrintData::SetQuality}\label{wxprintdatasetquality}
+
+\func{void}{SetQuality}{\param{wxPrintQuality}{ quality}}
+
+Sets the desired print quality. This can be a positive integer, denoting the number of dots per inch, or
+one of the following identifiers:
+
+\begin{verbatim}
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
+\end{verbatim}
+
+On input you should pass one of these identifiers, but on return you may get back a positive integer
+indicating the current resolution setting.
+
+\membersection{wxPrintData::operator $=$}\label{wxprintdataassign}
+
+\func{void}{operator $=$}{\param{const wxPrintData\&}{ data}}
+
+Assigns print data to this object.
+
+\func{void}{operator $=$}{\param{const wxPrintSetupData\&}{ data}}
+
+Assigns print setup data to this object. wxPrintSetupData is deprecated,
+but retained for backward compatibility.
 
 \section{\class{wxPrintDialog}}\label{wxprintdialog}
 
@@ -183,14 +315,14 @@ a successfully dismissed print dialog.
 
 \membersection{wxPrintDialog::wxPrintDialog}
 
-\func{}{wxPrintDialog}{\param{wxWindow* }{parent}, \param{wxPrintData* }{data = NULL}}
+\func{}{wxPrintDialog}{\param{wxWindow* }{parent}, \param{wxPrintDialogData* }{data = NULL}}
 
 Constructor. Pass a parent window, and optionally a pointer to a block of print
 data, which will be copied to the print dialog's print data.
 
 \wxheading{See also}
 
-\helpref{wxPrintData}{wxprintdata}
+\helpref{wxPrintDialogData}{wxprintdialogdata}
 
 \membersection{wxPrintDialog::\destruct{wxPrintDialog}}
 
@@ -199,11 +331,11 @@ data, which will be copied to the print dialog's print data.
 Destructor. If wxPrintDialog::GetPrintDC has {\it not} been called,
 the device context obtained by the dialog (if any) will be deleted.
 
-\membersection{wxPrintDialog::GetPrintData}\label{wxprintdialoggetprintdata}
+\membersection{wxPrintDialog::GetPrintDialogData}\label{wxprintdialoggetprintdialogdata}
 
-\func{wxPrintData\&}{GetPrintData}{\void}
+\func{wxPrintDialogData\&}{GetPrintDialogData}{\void}
 
-Returns the \helpref{print data}{wxprintdata} associated with the print dialog.
+Returns the \helpref{print dialog data}{wxprintdialogdata} associated with the print dialog.
 
 \membersection{wxPrintDialog::GetPrintDC}\label{wxprintdialoggetprintdc}
 
@@ -214,6 +346,14 @@ When this function has been called, the ownership of the device context
 is transferred to the application, so it must then be deleted
 explicitly.
 
+\membersection{wxPrintDialog::Ok}\label{wxprintdialogok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns true if the print data associated with the dialog is valid.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
+
 \membersection{wxPrintDialog::ShowModal}\label{wxprintdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -222,6 +362,213 @@ Shows the dialog, returning wxID\_OK if the user pressed OK, and wxID\_CANCEL
 otherwise. After this function is called, a device context may
 be retrievable using \helpref{wxPrintDialog::GetPrintDC}{wxprintdialoggetprintdc}.
 
+\section{\class{wxPrintDialogData}}\label{wxprintdialogdata}
+
+This class holds information related to the visual characteristics of wxPrintDialog.
+It contains a wxPrintData object with underlying printing settings.
+
+\wxheading{Derived from}
+
+\helpref{wxObject}{wxobject}
+
+\wxheading{Include files}
+
+<wx/cmndata.h>
+
+\wxheading{See also}
+
+\helpref{wxPrintDialog}{wxprintdialog}, \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
+
+\latexignore{\rtfignore{\wxheading{Members}}}
+
+\membersection{wxPrintDialogData::wxPrintDialogData}
+
+\func{}{wxPrintDialogData}{\void}
+
+Default constructor.
+
+\func{}{wxPrintDialogData}{\param{wxPrintDialogData\&}{ dialogData}}
+
+Copy constructor.
+
+\func{}{wxPrintDialogData}{\param{wxPrintData\&}{ printData}}
+
+Construct an object from a print dialog data object.
+
+\membersection{wxPrintDialogData::\destruct{wxprintdialogdata}}
+
+\func{}{\destruct{wxPrintDialogData}}{\void}
+
+Destructor.
+
+\membersection{wxPrintDialogData::EnableHelp}\label{wxprintdialogdataenablehelp}
+
+\func{void}{EnableHelp}{\param{bool }{flag}}
+
+Enables or disables the `Help' button.
+
+\membersection{wxPrintDialogData::EnablePageNumbers}\label{wxprintdialogdataenablepagenumbers}
+
+\func{void}{EnablePageNumbers}{\param{bool }{flag}}
+
+Enables or disables the `Page numbers' controls.
+
+\membersection{wxPrintDialogData::EnablePrintToFile}\label{wxprintdialogdataenableprinttofile}
+
+\func{void}{EnablePrintToFile}{\param{bool }{flag}}
+
+Enables or disables the `Print to file' checkbox.
+
+\membersection{wxPrintDialogData::EnableSelection}\label{wxprintdialogdataenableselection}
+
+\func{void}{EnableSelection}{\param{bool }{flag}}
+
+Enables or disables the `Selection' radio button.
+
+\membersection{wxPrintDialogData::GetAllPages}\label{wxprintdialogdatagetallpages}
+
+\constfunc{bool}{GetAllPages}{\void}
+
+Returns true if the user requested that all pages be printed.
+
+\membersection{wxPrintDialogData::GetCollate}\label{wxprintdialogdatagetcollate}
+
+\constfunc{bool}{GetCollate}{\void}
+
+Returns true if the user requested that the document(s) be collated.
+
+\membersection{wxPrintDialogData::GetFromPage}\label{wxprintdialogdatagetfrompage}
+
+\constfunc{int}{GetFromPage}{\void}
+
+Returns the {\it from} page number, as entered by the user.
+
+\membersection{wxPrintDialogData::GetMaxPage}\label{wxprintdialogdatagetmaxpage}
+
+\constfunc{int}{GetMaxPage}{\void}
+
+Returns the {\it maximum} page number.
+
+\membersection{wxPrintDialogData::GetMinPage}\label{wxprintdialogdatagetminpage}
+
+\constfunc{int}{GetMinPage}{\void}
+
+Returns the {\it minimum} page number.
+
+\membersection{wxPrintDialogData::GetNoCopies}\label{wxprintdialogdatagetnocopies}
+
+\constfunc{int}{GetNoCopies}{\void}
+
+Returns the number of copies requested by the user.
+
+\membersection{wxPrintDialogData::GetPrintData}\label{wxprintdialogdatagetprintdata}
+
+\func{wxPrintData\&}{GetPrintData}{\void}
+
+Returns a reference to the internal wxPrintData object.
+
+\membersection{wxPrintDialogData::GetPrintToFile}\label{wxprintdialogdatagetprinttofile}
+
+\constfunc{bool}{GetPrintToFile}{\void}
+
+Returns true if the user has selected printing to a file.
+
+\membersection{wxPrintDialogData::GetSelection}\label{wxprintdialogdatagetselection}
+
+\constfunc{bool}{GetSelection}{\void}
+
+Returns true if the user requested that the selection be printed (where 'selection' is
+a concept specific to the application).
+
+\membersection{wxPrintDialogData::GetToPage}\label{wxprintdialogdatagettopage}
+
+\constfunc{int}{GetToPage}{\void}
+
+Returns the {\it to} page number, as entered by the user.
+
+\membersection{wxPrintDialogData::Ok}\label{wxprintdialogdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns true if the print data is valid for using in print dialogs.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
+
+\membersection{wxPrintDialogData::SetCollate}\label{wxprintdialogdatasetcollate}
+
+\func{void}{SetCollate}{\param{bool }{flag}}
+
+Sets the 'Collate' checkbox to true or false.
+
+\membersection{wxPrintDialogData::SetFromPage}\label{wxprintdialogdatasetfrompage}
+
+\func{void}{SetFromPage}{\param{int }{page}}
+
+Sets the {\it from} page number.
+
+\membersection{wxPrintDialogData::SetMaxPage}\label{wxprintdialogdatasetmaxpage}
+
+\func{void}{SetMaxPage}{\param{int }{page}}
+
+Sets the {\it maximum} page number.
+
+\membersection{wxPrintDialogData::SetMinPage}\label{wxprintdialogdatasetminpage}
+
+\func{void}{SetMinPage}{\param{int }{page}}
+
+Sets the {\it minimum} page number.
+
+\membersection{wxPrintDialogData::SetNoCopies}\label{wxprintdialogdatasetnocopies}
+
+\func{void}{SetNoCopies}{\param{int }{n}}
+
+Sets the default number of copies the user has requested to be printed out.
+
+\membersection{wxPrintDialogData::SetPrintData}\label{wxprintdialogdatasetprintdata}
+
+\func{void}{SetPrintData}{\param{const wxPrintData\& }{printData}}
+
+Sets the internal wxPrintData.
+
+\membersection{wxPrintDialogData::SetPrintToFile}\label{wxprintdialogdatasetprinttofile}
+
+\func{void}{SetPrintToFile}{\param{bool }{flag}}
+
+Sets the 'Print to file' checkbox to true or false.
+
+\membersection{wxPrintDialogData::SetSelection}\label{wxprintdialogdatasetselection}
+
+\func{void}{SetSelection}{\param{bool}{ flag}}
+
+Selects the 'Selection' radio button. The effect of printing the selection depends on how the application
+implements this command, if at all.
+
+\membersection{wxPrintDialogData::SetSetupDialog}\label{wxprintdialogdatasetsetupdialog}
+
+\func{void}{SetSetupDialog}{\param{bool }{flag}}
+
+Determines whether the dialog to be shown will be the Print dialog
+(pass false) or Print Setup dialog (pass true).
+
+Note that the setup dialog is (according to Microsoft) obsolete from
+Windows 95, though retained for backward compatibility.
+
+\membersection{wxPrintDialogData::SetToPage}\label{wxprintdialogdatasettopage}
+
+\func{void}{SetToPage}{\param{int }{page}}
+
+Sets the {\it to} page number.
+
+\membersection{wxPrintDialogData::operator $=$}\label{wxprintdialogdataassign}
+
+\func{void}{operator $=$}{\param{const wxPrintData\&}{ data}}
+
+Assigns print data to this object.
+
+\func{void}{operator $=$}{\param{const wxPrintDialogData\&}{ data}}
+
+Assigns another print dialog data object to this object.
+
 \section{\class{wxPrinter}}\label{wxprinter}
 
 This class represents the Windows or PostScript printer, and is the vehicle through
@@ -247,13 +594,14 @@ method of printing.
 
 \membersection{wxPrinter::wxPrinter}
 
-\func{}{wxPrinter}{\param{wxPrintData* }{data = NULL}}
+\func{}{wxPrinter}{\param{wxPrintDialogData* }{data = NULL}}
 
 Constructor. Pass an optional pointer to a block of print
-data, which will be copied to the printer object's print data.
+dialog data, which will be copied to the printer object's local data.
 
 \wxheading{See also}
 
+\helpref{wxPrintDialogData}{wxprintdialogdata},
 \helpref{wxPrintData}{wxprintdata}
 
 \membersection{wxPrinter::\destruct{wxPrinter}}
@@ -266,7 +614,7 @@ Destructor.
 
 \func{bool}{Abort}{\void}
 
-Returns TRUE if the user has aborted the print job.
+Returns true if the user has aborted the print job.
 
 \membersection{wxPrinter::CreateAbortWindow}\label{wxprintercreateabortwindow}
 
@@ -274,27 +622,55 @@ Returns TRUE if the user has aborted the print job.
 
 Creates the default printing abort window, with a cancel button.
 
-\membersection{wxPrinter::GetPrintData}\label{wxprintergetprintdata}
 
-\func{wxPrintData\&}{GetPrintData}{\void}
+\membersection{wxPrinter::GetLastError}\label{wxprintergetlasterror}
+
+\func{static wxPrinterError}{GetLastError}{\void}
+
+Return last error. Valid after calling \helpref{Print}{wxprinterprint},
+\helpref{PrintDialog}{wxprinterprintdialog} or 
+\helpref{wxPrintPreview::Print}{wxprintpreviewprint}. These functions 
+set last error to {\bf wxPRINTER\_NO\_ERROR} if no error happened.
+
+Returned value is one of the following:
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxPRINTER\_NO\_ERROR}}{No error happened.}
+\twocolitem{{\bf wxPRINTER\_CANCELLED}}{The user cancelled printing.}
+\twocolitem{{\bf wxPRINTER\_ERROR}}{There was an error during printing.}
+\end{twocollist}
+
+
+\membersection{wxPrinter::GetPrintDialogData}\label{wxprintergetprintdialogdata}
+
+\func{wxPrintDialogData\&}{GetPrintDialogData}{\void}
 
 Returns the \helpref{print data}{wxprintdata} associated with the printer object.
 
 \membersection{wxPrinter::Print}\label{wxprinterprint}
 
-\func{bool}{Print}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{bool }{prompt=TRUE}}
+\func{bool}{Print}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{bool }{prompt=true}}
 
 Starts the printing process. Provide a parent window, a user-defined wxPrintout object which controls
 the printing of a document, and whether the print dialog should be invoked first.
 
-Print could return FALSE if there was a problem initializing the printer device context
-(current printer not set, for example).
+Print could return false if there was a problem initializing the printer device context
+(current printer not set, for example) or the user cancelled printing. Call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error.
 
 \membersection{wxPrinter::PrintDialog}\label{wxprinterprintdialog}
 
-\func{bool}{PrintDialog}{\param{wxWindow *}{parent}}
+\func{wxDC*}{PrintDialog}{\param{wxWindow *}{parent}}
 
-Invokes the print dialog.
+Invokes the print dialog. If successful (the user did not press Cancel
+and no error occurred), a suitable device context will be returned
+(otherwise NULL is returned -- call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error).
+
+The application must delete this device context to avoid a memory leak.
 
 \membersection{wxPrinter::ReportError}\label{wxprinterreporterror}
 
@@ -304,7 +680,7 @@ Default error-reporting function.
 
 \membersection{wxPrinter::Setup}\label{wxprintersetup}
 
-\func{void}{Setup}{\param{wxWindow *}{parent}}
+\func{bool}{Setup}{\param{wxWindow *}{parent}}
 
 Invokes the print setup dialog. Note that the setup dialog is obsolete from
 Windows 95, though retained for backward compatibility.
@@ -333,14 +709,22 @@ achieving the correct scaling for the page.
 
 \membersection{wxPrinterDC::wxPrinterDC}
 
+\func{}{wxPrinterDC}{\param{const wxPrintData\& }{printData}}
+
+Pass a \helpref{wxPrintData}{wxprintdata} object with information
+necessary for setting up a suitable printer device context. This
+is the recommended way to construct a wxPrinterDC.
+
 \func{}{wxPrinterDC}{\param{const wxString\& }{driver}, \param{const wxString\& }{device}, \param{const wxString\& }{output},
- \param{const bool }{interactive = TRUE}, \param{int }{orientation = wxPORTRAIT}}
+ \param{const bool }{interactive = true}, \param{int }{orientation = wxPORTRAIT}}
 
 Constructor. With empty strings for the first three arguments, the default printer dialog is
 displayed. {\it device} indicates the type of printer and {\it output}
 is an optional file for printing to. The {\it driver} parameter is
 currently unused.  Use the {\it Ok} member to test whether the
-constructor was successful in creating a useable device context.
+constructor was successful in creating a usable device context.
+
+This constructor is deprecated and retained only for backward compatibility.
 
 \section{\class{wxPrintout}}\label{wxprintout}
 
@@ -369,7 +753,8 @@ wxPrintPreview object to initiate printing or previewing.
 
 \func{}{wxPrintout}{\param{const wxString\& }{title = "Printout"}}
 
-Constructor. Pass an optional title argument (currently unused).
+Constructor. Pass an optional title argument - the current filename would be a good idea. This will appear in the printing list
+(at least in MSW)
 
 \membersection{wxPrintout::\destruct{wxPrintout}}
 
@@ -395,12 +780,26 @@ returns 1, 32000 for the page minimum and maximum values, and 1, 1 for the requi
 
 If {\it minPage} is zero, the page number controls in the print dialog will be disabled.
 
+\pythonnote{When this method is implemented in a derived Python class,
+it should be designed to take no parameters (other than the self
+reference) and to return a tuple of four integers.
+}
+
+\perlnote{When this method is overridden in a derived class,
+it must not take any parameters, and returns a 4-element list.
+}
+
 \membersection{wxPrintout::GetPageSizeMM}\label{wxprintoutgetpagesizemm}
 
 \func{void}{GetPageSizeMM}{\param{int *}{w}, \param{int *}{h}}
 
 Returns the size of the printer page in millimetres.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPageSizePixels}\label{wxprintoutgetpagesizepixels}
 
 \func{void}{GetPageSizePixels}{\param{int *}{w}, \param{int *}{h}}
@@ -412,6 +811,11 @@ memory device context is used, using a bitmap size reflecting the current
 preview zoom. The application must take this discrepancy into account if
 previewing is to be supported.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPPIPrinter}\label{wxprintoutgetppiprinter}
 
 \func{void}{GetPPIPrinter}{\param{int *}{w}, \param{int *}{h}}
@@ -421,6 +825,11 @@ Dividing the printer PPI by the screen PPI can give a suitable scaling
 factor for drawing text onto the printer. Remember to multiply
 this by a scaling factor to take the preview DC size into account.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPPIScreen}\label{wxprintoutgetppiscreen}
 
 \func{void}{GetPPIScreen}{\param{int *}{w}, \param{int *}{h}}
@@ -430,30 +839,45 @@ Dividing the printer PPI by the screen PPI can give a suitable scaling
 factor for drawing text onto the printer. Remember to multiply
 this by a scaling factor to take the preview DC size into account.
 
+\membersection{wxPrintout::GetTitle}\label{wxprintoutgettitle}
+
+\func{wxString}{GetTitle}{\void}
+
+Returns the title of the printout
+
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::HasPage}\label{wxprintouthaspage}
 
 \func{bool}{HasPage}{\param{int}{ pageNum}}
 
-Should be overriden to return TRUE if the document has this page, or FALSE
-if not. Returning FALSE signifies the end of the document. By default,
+Should be overridden to return true if the document has this page, or false
+if not. Returning false signifies the end of the document. By default,
 HasPage behaves as if the document has only one page.
 
 \membersection{wxPrintout::IsPreview}\label{wxprintoutispreview}
 
 \func{bool}{IsPreview}{\void}
 
-Returns TRUE if the printout is currently being used for previewing.
+Returns true if the printout is currently being used for previewing.
 
 \membersection{wxPrintout::OnBeginDocument}\label{wxprintoutonbegindocument}
 
 \func{bool}{OnBeginDocument}{\param{int}{ startPage}, \param{int}{ endPage}}
 
-Called by the framework at the start of document printing. Return FALSE from
+Called by the framework at the start of document printing. Return false from
 this function cancels the print job. OnBeginDocument is called once for every
 copy printed.
 
 The base wxPrintout::OnBeginDocument {\it must} be called (and the return value
-checked) from within the overriden function, since it calls wxDC::StartDoc.
+checked) from within the overridden function, since it calls wxDC::StartDoc.
+
+\pythonnote{If this method is overridden in a Python class then the
+base class version can be called by using the method
+{\tt base\_OnBeginDocument(startPage, endPage)}. }
 
 \membersection{wxPrintout::OnEndDocument}\label{wxprintoutonenddocument}
 
@@ -463,7 +887,7 @@ Called by the framework at the end of document printing. OnEndDocument
 is called once for every copy printed.
 
 The base wxPrintout::OnEndDocument {\it must} be called
-from within the overriden function, since it calls wxDC::EndDoc.
+from within the overridden function, since it calls wxDC::EndDoc.
 
 \membersection{wxPrintout::OnBeginPrinting}\label{wxprintoutonbeginprinting}
 
@@ -491,14 +915,12 @@ number of pages in the document, for example.
 
 \func{bool}{OnPrintPage}{\param{int}{ pageNum}}
 
-Called by the framework when a page should be printed. Returning FALSE cancels
+Called by the framework when a page should be printed. Returning false cancels
 the print job. The application can use wxPrintout::GetDC to obtain a device
 context to draw on.
 
 \section{\class{wxPrintPreview}}\label{wxprintpreview}
 
-\overview{Printing framework overview}{printingoverview}
-
 Objects of this class manage the print preview process. The object is passed
 a wxPrintout object, and the wxPrintPreview object itself is passed to
 a wxPreviewFrame object. Previewing is started by initializing and showing
@@ -540,7 +962,7 @@ called, since they will be deleted in the wxPrintPreview constructor.
 The same does not apply to the {\it data} argument.
 
 Test the Ok member to check whether the wxPrintPreview object was created correctly.
-Ok could return FALSE if there was a problem initializing the printer device context
+Ok could return false if there was a problem initializing the printer device context
 (current printer not set, for example).
 
 \membersection{wxPrintPreview::\destruct{wxPrintPreview}}
@@ -559,7 +981,7 @@ internally.
 
 \membersection{wxPrintPreview::GetCanvas}\label{wxprintpreviewgetcanvas}
 
-\func{wxWindow* }{GetCanvas}{\void}
+\func{wxPreviewCanvas* }{GetCanvas}{\void}
 
 Gets the preview window used for displaying the print preview image.
 
@@ -611,7 +1033,7 @@ or NULL if none exists.
 
 \func{bool}{Ok}{\void}
 
-Returns TRUE if the wxPrintPreview is valid, FALSE otherwise. It could return FALSE if there was a
+Returns true if the wxPrintPreview is valid, false otherwise. It could return false if there was a
 problem initializing the printer device context (current printer not set, for example).
 
 \membersection{wxPrintPreview::PaintPage}\label{wxprintpreviewpaintpage}
@@ -633,6 +1055,10 @@ supplied in the wxPrintPreview constructor.
 Will normally be called by the {\bf Print...} panel item on the
 preview frame's control bar.
 
+Returns false in case of error -- call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error.
+
 \membersection{wxPrintPreview::RenderPage}\label{wxprintpreviewrenderpage}
 
 \func{bool}{RenderPage}{\param{int }{pageNum}}
@@ -641,7 +1067,7 @@ Renders a page into a wxMemoryDC. Used internally by wxPrintPreview.
 
 \membersection{wxPrintPreview::SetCanvas}\label{wxprintpreviewsetcanvas}
 
-\func{void}{SetCanvas}{\param{wxWindow* }{window}}
+\func{void}{SetCanvas}{\param{wxPreviewCanvas** }{window}}
 
 Sets the window to be used for displaying the print preview image.
 
@@ -671,4 +1097,3 @@ Associates a printout object with the wxPrintPreview object.
 Sets the percentage preview zoom, and refreshes the preview canvas
 accordingly.
 
-
