X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/954b8ae60391d18b87a604e7919c87c0c6ae208b..0e300ddd7d91d46e3d9fcbbefe916b0fda6fcbbc:/docs/latex/wx/activevt.tex

diff --git a/docs/latex/wx/activevt.tex b/docs/latex/wx/activevt.tex
index 515282ef28..54102fe920 100644
--- a/docs/latex/wx/activevt.tex
+++ b/docs/latex/wx/activevt.tex
@@ -35,7 +35,8 @@ or a frame becomes inactivate resulting in all application frames being inactive
 \wxheading{See also}
 
 \helpref{wxWindow::OnActivate}{wxwindowonactivate},\rtfsp
-\helpref{wxApp::OnActivate}{wxapponactivate},\rtfsp
+%% GD: OnXXX functions are not documented
+%%\helpref{wxApp::OnActivate}{wxapponactivate},\rtfsp
 \helpref{Event handling overview}{eventhandlingoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
