X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/953704c1c76cfb9cfb7b91f0e81f98c30d27eb56..772c017b2c30f5cb8072d7b22f39da175e101e9a:/docs/latex/wx/node.tex?ds=sidebyside

diff --git a/docs/latex/wx/node.tex b/docs/latex/wx/node.tex
index c718a7220e..c2b6600772 100644
--- a/docs/latex/wx/node.tex
+++ b/docs/latex/wx/node.tex
@@ -3,7 +3,7 @@
 A node structure used in linked lists (see \helpref{wxList}{wxlist}) and
 derived classes. You should never use wxNodeBase class directly because it
 works with untyped (void *) data and this is unsafe. Use wxNode-derived classes
-which are defined by WX\_DECLARE\_LIST and WX\_DEFIBE\_LIST macros instead as
+which are defined by WX\_DECLARE\_LIST and WX\_DEFINE\_LIST macros instead as
 described in \helpref{wxList}{wxlist} documentation (see example there). wxNode
 is defined for compatibility as wxNodeBase containing "wxObject *" pointer, but
 usage of this class is deprecated.
