X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/94f562a27908672661ad7720507bba0753ca3ac6..e195c8c95fb154d035bab400952fc81c62439549:/docs/latex/wx/dir.tex?ds=inline

diff --git a/docs/latex/wx/dir.tex b/docs/latex/wx/dir.tex
index cb9dca65d9..f54e104053 100644
--- a/docs/latex/wx/dir.tex
+++ b/docs/latex/wx/dir.tex
@@ -146,9 +146,9 @@ Depending on the return value, the enumeration may continue or stop.
 The function returns the total number of files found or {\tt (size\_t)-1} on
 error.
 
-See also: \helpref{GetAllFiles}\label{wxdirgetallfiles}
+See also: \helpref{GetAllFiles}{wxdirgetallfiles}
 
-\membersection{wxDir::GetAllFiles}{wxdirgetallfiles}
+\membersection{wxDir::GetAllFiles}\label{wxdirgetallfiles}
 
 \func{static size\_t}{GetAllFiles}{\param{const wxString& }{dirname}, \param{wxArrayString *}{files}, \param{const wxString& }{filespec = wxEmptyString}, \param{int }{flags = wxDIR\_DEFAULT}}
 
