X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/940bbac18f7ba7e1206951480193ab1dc82ec18c..4383e2b12aa48171114576725d5cead06e7e962a:/docs/latex/wx/display.tex

diff --git a/docs/latex/wx/display.tex b/docs/latex/wx/display.tex
index 3a39b3da8e..a7ff86db58 100644
--- a/docs/latex/wx/display.tex
+++ b/docs/latex/wx/display.tex
@@ -100,6 +100,8 @@ If the window is on more than one display it gets the display that overlaps the
 
 Returns -1 if the window is not on any connected display.
 
+Currently wxMSW only.
+
 \wxheading{Parameters}
 
 \docparam{win}{The window to locate.}
