X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/93ed8ff7707eec179cf99f2f2f3c36f27916b068..d3f00f59938d4801a95afa1cd638b8f15c481ee3:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 0b125a7da9..8c15876b0c 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -16,12 +16,6 @@ wxDynamicLibrary is a class representing dynamically loadable library
 this class to load a library and don't worry about unloading it -- it will be
 done in the objects destructor automatically.
 
-% deprecated now...
-%
-%\wxheading{See also}
-%
-%\helpref{wxDllLoader}{wxdllloader}
-
 \wxheading{Derived from}
 
 No base class.
@@ -30,6 +24,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -45,7 +43,7 @@ Constructor. Second form calls \helpref{Load}{wxdynamiclibraryload}.
 
 \membersection{wxDynamicLibrary::CanonicalizeName}\label{wxdynamiclibrarycanonicalizename}
 
-\func{wxString}{CanonicalizeName}{\param{const wxString\& }{name}, \param{wxDynamicLibraryCategory}{ cat = wxDL\_LIBRARY}}
+\func{static wxString}{CanonicalizeName}{\param{const wxString\& }{name}, \param{wxDynamicLibraryCategory}{ cat = wxDL\_LIBRARY}}
 
 Returns the platform-specific full name for the library called \arg{name}. E.g.
 it adds a {\tt ".dll"} extension under Windows and {\tt "lib"} prefix and 
@@ -66,7 +64,7 @@ The possible values for \arg{cat} are:
 
 \membersection{wxDynamicLibrary::CanonicalizePluginName}\label{wxdynamiclibrarycanonicalizepluginname}
 
-\func{wxString}{CanonicalizePluginName}{\param{const wxString\& }{name}, \param{wxPluginCategory}{ cat = wxDL\_PLUGIN\_GUI}}
+\func{static wxString}{CanonicalizePluginName}{\param{const wxString\& }{name}, \param{wxPluginCategory}{ cat = wxDL\_PLUGIN\_GUI}}
 
 This function does the same thing as 
 \helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWidgets
@@ -206,6 +204,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
