X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9390546335e0e007904f49504edd048d05caa339..134198f1b773199b5506c302bf9510831d0319f5:/docs/latex/wx/thread.tex

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index ad1cb401fd..73ff763528 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -19,6 +19,10 @@ None.
 
 <wx/thread.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxMutex}{wxmutex}, \helpref{wxCondition}{wxcondition}, \helpref{wxCriticalSection}{wxcriticalsection}
