X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/92cd4cf182524324dec48830cb3141735219233a..0d97c0902355bd73c080ebffa45ec809813df51d:/docs/latex/wx/libs.tex

diff --git a/docs/latex/wx/libs.tex b/docs/latex/wx/libs.tex
index 0183a64e7b..27bfd64ea3 100644
--- a/docs/latex/wx/libs.tex
+++ b/docs/latex/wx/libs.tex
@@ -104,6 +104,14 @@ contained in this library, as well as
 
 \helpref{Database classes}{odbcoverview}. Requires wxBase.
 
+{\large {\bf wxQA}}
+
+This is the library containing extra classes for quality assurance. Currently
+it only contains classes for generating and processing debug reports in case of
+program crash or exception, but more classes will be added to it in the future.
+
+Requires wxCore, wxBase and wxXML.
+
 {\large {\bf wxDbGrid}}
 
 \helpref{wxDbGridTableBase}{wxdbgridtablebase} class which combines 
