X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/90e572f1e5af1e51fd14e2e1e6f64fa3e258e590..85136e3bf5dadf921652519e71da5db351fb3194:/docs/latex/wx/semaphor.tex

diff --git a/docs/latex/wx/semaphor.tex b/docs/latex/wx/semaphor.tex
index 13f8816fd5..9d9271f944 100644
--- a/docs/latex/wx/semaphor.tex
+++ b/docs/latex/wx/semaphor.tex
@@ -36,6 +36,10 @@ No base class
 
 <wx/thread.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxSemaphore::wxSemaphore}\label{wxsemaphorewxsemaphore}
@@ -43,8 +47,9 @@ No base class
 \func{}{wxSemaphore}{\param{int }{initialcount = 0}, \param{int }{maxcount = 0}}
 
 Specifying a {\it maxcount} of $0$ actually makes wxSemaphore behave as if
-there is no upper limit. If maxcount is $1$, the semaphore behaves exactly as a
-mutex.
+there is no upper limit. If maxcount is $1$, the semaphore behaves almost as a
+mutex (but unlike a mutex it can be released by a thread different from the one
+which acquired it).
 
 {\it initialcount} is the initial value of the semaphore which must be between
 $0$ and {\it maxcount} (if it is not set to $0$).
