X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/90a1a975d4f1c07b53e0f70df7cde32ab1d84f53..a1fea40ec6e5f9bccba51bc1df625e01cb708e90:/docs/latex/wx/tapp.tex

diff --git a/docs/latex/wx/tapp.tex b/docs/latex/wx/tapp.tex
index 563b3d085b..f748843b83 100644
--- a/docs/latex/wx/tapp.tex
+++ b/docs/latex/wx/tapp.tex
@@ -7,7 +7,7 @@ A wxWindows application does not have a {\it main} procedure; the equivalent is
 \rtfsp{\it OnInit} will usually create a top window as a bare minimum.
 
 Unlike in earlier versions of wxWindows, OnInit does not return a frame. Instead it
-returns a boolean value which indicates whether processing should continue (TRUE) or not (FALSE).
+returns a boolean value which indicates whether processing should continue (true) or not (false).
 You call \helpref{wxApp::SetTopWindow}{wxappsettopwindow} to let wxWindows know
 about the top window.
 
@@ -22,7 +22,8 @@ is to explicitly delete child frames in the top-level frame's \helpref{wxCloseEv
 handler.
 
 In emergencies the \helpref{wxExit}{wxexit} function can be called to kill the
-application.
+application however normally the applications shuts down automatically, 
+\helpref{see below}{wxappshutdownoverview}.
 
 An example of defining an application follows:
 
@@ -39,10 +40,10 @@ bool DerivedApp::OnInit()
 {
   wxFrame *the_frame = new wxFrame(NULL, ID_MYFRAME, argv[0]);
   ...
-  the_frame->Show(TRUE);
+  the_frame->Show(true);
   SetTopWindow(the_frame);
 
-  return TRUE;
+  return true;
 }
 \end{verbatim}
 
@@ -55,11 +56,25 @@ construction time.
 You can also use DECLARE\_APP(appClass) in a header file to declare the wxGetApp function which returns
 a reference to the application object.
 
-\subsection{Application shutdown}
-
-\helpref{OnExit}{wxapponexit} is called when the application exits but {\it before}
-wxWindows cleans its internal structures. Your should delete all wxWindows object that
-your created by the time OnExit finishes. In particular, do {\bf not} destroy them
+\subsection{Application shutdown}\label{wxappshutdownoverview}
+
+The application normally shuts down when the last of its top level windows is
+closed. This is normally the expected behaviour and means that it is enough to
+call \helpref{Close()}{wxwindowclose} in response to the {\tt "Exit"} menu
+command if your program has a single top level window. If this behaviour is not
+desirable \helpref{wxApp::SetExitOnFrameDelete}{wxappsetexitonframedelete} can
+be called to change it. Note that starting from wxWindows 2.3.3 such logic
+doesn't apply for the windows shown before the program enters the main loop: in
+other words, you can safely show a dialog from 
+\helpref{wxApp::OnInit}{wxapponinit} and not be afraid that your application
+terminates when this dialog -- which is the last top level window for the
+moment -- is closed.
+
+
+Another aspect of the application shutdown is the \helpref{OnExit}{wxapponexit} 
+which is called when the application exits but {\it before} wxWindows cleans up
+its internal structures. Your should delete all wxWindows object that your
+created by the time OnExit finishes. In particular, do {\bf not} destroy them
 from application class' destructor!
 
 For example, this code may crash:
