X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8fa2e6a209ab83319bbc4d652067c9123deaa335..0cbff1201aa47e2b73ec90a97886f18e88270ea6:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 2c243409d3..5cf893f2be 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -18,17 +18,14 @@ progress bar. Optionally, it can display an ABORT button.
 
 \membersection{wxProgressDialog::wxProgressDialog}\label{wxprogressdialogconstr}
 
-\func{}{wxProgressDialog}
-{\param{const wxString\& }{title},
-  \param{const wxString\& }{message},\rtfsp
-  \param{int }{maximum = 100},
-  \param{wxWindow * }{parent = NULL},\rtfsp
-  \param{bool }{disableParentOnly = FALSE},\rtfsp
-  \param{bool }{abortButton = FALSE}
-  }
+\func{}{wxProgressDialog}{\param{const wxString\& }{title},
+ \param{const wxString\& }{message},\rtfsp
+ \param{int }{maximum = 100},
+ \param{wxWindow * }{parent = NULL},\rtfsp
+ \param{int }{style = wxPD\_AUTO\_HIDE | wxPD\_APP\_MODAL}}
 
 Constructor. Creates the dialog, displays it and disables user input
-for other windows, or, if disableParentOnly = TRUE, for its parent
+for other windows, or, if wxPD\_APP\_MODAL flag is not given, for its parent
 window only.
 
 \wxheading{Parameters}
@@ -43,17 +40,33 @@ window only.
 
 \docparam{message}{Message to show on the dialog.}
 
-\docparam{disableParentOnly}{By default, the dialog disables user
-  input for all other top level windows. If this parameter is TRUE, it 
-  will only disable the window passes as parent.}
-
-\docparam{abortButton}{If TRUE, will display an ABORT button.}
+\docparam{style}{The dialog style. This is the combination of the following
+bitmask constants defined in wx/defs.h:
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxPD\_APP\_MODAL}}{Make the progress dialog modal. If this flag is
+not given, it is only "locally" modal - that is the input to the parent
+window is disabled, but not to the other ones.}
+\twocolitem{{\bf wxPD\_AUTO\_HIDE}}{Causes the progress dialog to disappear
+from screen as soon as the maximum value of the progress meter has been
+reached.}
+\twocolitem{{\bf wxPD\_CAN\_ABORT}}{This flag tells the dialog that it should have a
+"Cancel" button which the user may press. If this happens, the next call to 
+ \helpref{Update()}{wxprogressdialogupdate} will return FALSE.}
+\twocolitem{{\bf wxPD\_ELAPSED\_TIME}}{This flag tells the dialog that it should show elapsed time (since creating the dialog).}
+\twocolitem{{\bf wxPD\_ESTIMATED\_TIME}}{This flag tells the dialog that it should show estimated time.}
+\twocolitem{{\bf wxPD\_REMAINING\_TIME}}{This flag tells the dialog that it should show remaining time.}
+%\twocolitem{{\bf wxPD\_SMOOTH}}{This flag tells the dialog that it should use
+%smooth gauge (has effect only under 32bit Windows).}
+\end{twocollist}%
+}
 
 \membersection{wxProgressDialog::\destruct{wxProgressDialog}}
 
 \func{}{\destruct{wxMessageDialog}}{\void}
-Destructor.
-Deletes the dialog and enables all top level windows.
+
+Destructor. Deletes the dialog and enables all top level windows.
 
 \membersection{wxProgressDialog::Update}\label{wxprogressdialogupdate}
 
@@ -62,14 +75,23 @@ Deletes the dialog and enables all top level windows.
   \param{const char * }{newmsg = NULL},  }
 
 Updates the dialog, setting the progress bar to the new value and, if
-given exchanges the message above it. Returns TRUE if the ABORT button 
+given changes the message above it. Returns TRUE if the ABORT button 
 has \emph{not} been pressed.
 
+If FALSE is returned, the application can either immediately destroy the dialog
+or ask the user for the confirmation and if the abort is not confirmed the
+dialog may be resumed with \helpref{Resume}{wxprogressdialogresume} function.
+
+\docparam{value}{The new value of the progress meter. It must be strictly less
+than the maximum value given to the constructor (i.e., as usual in C, the
+index runs from $0$ to $maximum-1$).}
+\docparam{newmsg}{The new messages for the progress dialog text, if none is
+given the message is not changed.}
 
 \membersection{wxProgressDialog::Resume}\label{wxprogressdialogresume}
 
 \func{void}{Resume}{\void}
+
 Can be used to continue with the dialog, after the user had chosen
 ABORT.
 
-
