X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8e907a13eae0ef1cd0eb4a318c824ba095a64684..80d2803f703d1b238f42725504f08266ef02defe:/docs/latex/wx/ftp.tex

diff --git a/docs/latex/wx/ftp.tex b/docs/latex/wx/ftp.tex
index f49796142e..e3c5050379 100644
--- a/docs/latex/wx/ftp.tex
+++ b/docs/latex/wx/ftp.tex
@@ -181,7 +181,7 @@ You will be notified when the EOF is reached by an error.
 
 \wxheading{Return value}
 
-Returns NULL if an error occured (it could be a network failure or the fact
+Returns NULL if an error occurred (it could be a network failure or the fact
 that the file doesn't exist).
 
 Returns the initialized stream. You will have to delete it yourself when you
