X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8cb475f139b67c75f744c6060785812082df0758..b3a029f0bbf8262cfe30914790802f88608ea618:/docs/latex/wx/dataviewcolumn.tex

diff --git a/docs/latex/wx/dataviewcolumn.tex b/docs/latex/wx/dataviewcolumn.tex
index 3d09d76d53..479e4de5a7 100644
--- a/docs/latex/wx/dataviewcolumn.tex
+++ b/docs/latex/wx/dataviewcolumn.tex
@@ -17,9 +17,10 @@ These flags define behaviour of the column:
 \begin{verbatim}
 enum wxDataViewColumnFlags
 {
-    wxDATAVIEW_COL_RESIZABLE  = 1,    // the user can resize the column
-    wxDATAVIEW_COL_SORTABLE   = 2,    // same as SetSortable()
-    wxDATAVIEW_COL_HIDDEN     = 4     // column is hidden
+    wxDATAVIEW_COL_RESIZABLE    = 1,    // the user can resize the column
+    wxDATAVIEW_COL_SORTABLE     = 2,    // same as SetSortable()
+    wxDATAVIEW_COL_REORDERABLE  = 4,    // column can be reordered
+    wxDATAVIEW_COL_HIDDEN       = 8     // column is hidden
 };
 \end{verbatim}
 }
@@ -41,9 +42,9 @@ enum wxDataViewColumnFlags
 
 \membersection{wxDataViewColumn::wxDataViewColumn}\label{wxdataviewcolumnwxdataviewcolumn}
 
-\func{}{wxDataViewColumn}{\param{const wxString\& }{title}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = wxDVC_DEFAULT\_WIDTH}, \param{wxAlignment }{align = wxALIGN\_CENTRE}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
+\func{}{wxDataViewColumn}{\param{const wxString\& }{title}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = wxDVC\_DEFAULT\_WIDTH}, \param{wxAlignment }{align = wxALIGN\_CENTRE}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
 
-\func{}{wxDataViewColumn}{\param{const wxBitmap\& }{bitmap}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = wxDVC_DEFAULT\_WIDTH}, \param{wxAlignment }{align = wxALIGN\_CENTRE}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
+\func{}{wxDataViewColumn}{\param{const wxBitmap\& }{bitmap}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = wxDVC\_DEFAULT\_WIDTH}, \param{wxAlignment }{align = wxALIGN\_CENTRE}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
 
 Constructors.
 
@@ -81,6 +82,12 @@ Returns the renderer of this wxDataViewColumn.
 
 See also \helpref{wxDataViewRenderer}{wxdataviewrenderer}.
 
+\membersection{wxDataViewColumn::GetReorderable}\label{wxdataviewcolumngetreorderable}
+
+\func{bool}{GetReorderable}{\void}
+
+Returns true if the column is reorderable.
+
 \membersection{wxDataViewColumn::GetSortable}\label{wxdataviewcolumngetsortable}
 
 \func{bool}{GetSortable}{\void}
@@ -115,6 +122,14 @@ Set the alignment of the column header.
 
 Set the bitmap of the column header.
 
+\membersection{wxDataViewColumn::SetReorderable}\label{wxdataviewcolumnsetreorderable}
+
+\func{void}{SetReorderable}{\param{bool }{reorderable}}
+
+Indicate wether the column can be reordered by the
+user using the mouse. This is typically implemented 
+visually by dragging the header button around.
+
 \membersection{wxDataViewColumn::SetSortOrder}\label{wxdataviewcolumnsetsortorder}
 
 \func{void}{SetSortOrder}{\param{bool }{ascending}}
