X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8c517ddd1a2dd7eee7f95eb9ac1783f4a2e6fd76..c0bcc480680ecdf368839c119f5e984df757f893:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index 97d8a40446..4aa9a8df23 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -62,6 +62,22 @@ from its parent, no notification events will be sent to the parent and the
 object will delete itself upon reception of the process termination
 notification.
 
+\membersection{wxProcess::GetInputStream}\label{wxprocessgetinputstream}
+
+\constfunc{wxInputStream* }{GetInputStream}{\void}
+
+It returns a output stream corresponding to the input stream of the subprocess. 
+If it is NULL, you have not turned on the redirection.
+See \helpref{wxProcess::Redirect}{wxprocessredirect}.
+
+\membersection{wxProcess::GetOutputStream}\label{wxprocessgetoutputstream}
+
+\constfunc{wxOutputStream* }{GetOutputStream}{\void}
+
+It returns an output stream correspoding to the output stream of the subprocess.
+If it is NULL, you have not turned on the redirection.
+See \helpref{wxProcess::Redirect}{wxprocessredirect}.
+
 \membersection{wxProcess::OnTerminate}\label{wxprocessonterminate}
 
 \constfunc{void}{OnTerminate}{\param{int}{ pid}, \param{int}{ status}}
@@ -73,3 +89,12 @@ It raises a wxWindows event when it isn't overriden.
 
 \docparam{status}{The exit code of the process.}
 
+\membersection{wxProcess::Redirect}\label{wxprocessredirect}
+
+\func{void}{Redirect}{\void}
+
+It turns on the redirection, wxExecute will try to open a couple of pipes
+to catch the subprocess stdio. The caught input stream is returned by
+GetOutputStream() as a non-seekable stream. The caught output stream is returned
+by GetInputStream() as a non-seekable stream.
+
