X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8bb8ab39dd433191764a64b4f96344399b113d1b..4ec2df6cbc126adc3a5d9e337f057327430e28c3:/docs/latex/wx/validatr.tex

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index bbb413bf01..765c4d2084 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -18,6 +18,10 @@ To specify a default, `null' validator, use the symbol {\bf wxDefaultValidator}.
 
 For more information, please see \helpref{Validator overview}{validatoroverview}.
 
+\pythonnote{If you wish to create a validator class in wxPython you should
+derive the class from {\tt wxPyValidator} in order to get Python-aware
+capabilities for the various virtual methods.}
+
 \wxheading{Derived from}
 
 \helpref{wxEvtHandler}{wxevthandler}\\
@@ -30,9 +34,8 @@ For more information, please see \helpref{Validator overview}{validatoroverview}
 \wxheading{See also}
 
 \helpref{Validator overview}{validatoroverview}, 
-\helpref{wxTextValidator}{wxtextvalidator},
-\helpref{wxTextValidator}{wxgenericvalidator},
-
+\helpref{wxTextValidator}{wxtextvalidator}, 
+\helpref{wxGenericValidator}{wxgenericvalidator},
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -50,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
@@ -82,14 +85,14 @@ Associates a window with the validator.
 
 \membersection{wxValidator::TransferFromWindow}\label{wxvalidatortransferfromwindow}
 
-\func{virtual bool}{TransferToWindow}{\param{wxWindow*}{ parent}}
+\func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value in the window must be
 transferred to the validator. Return FALSE if there is a problem.
 
 \membersection{wxValidator::TransferToWindow}\label{wxvalidatortransfertowindow}
 
-\func{virtual bool}{TransferToWindow}{\param{wxWindow*}{ parent}}
+\func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value associated with the validator must be
 transferred to the window. Return FALSE if there is a problem.
@@ -101,4 +104,3 @@ transferred to the window. Return FALSE if there is a problem.
 This overridable function is called when the value in the associated window must be validated.
 Return FALSE if the value in the window is not valid; you may pop up an error dialog.
 
-
