X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8a46124968f1f9d2e707214fc4501cfc27abd0aa..380740af5dd112601916704a6d78d1112ebb31b5:/docs/latex/wx/renderer.tex

diff --git a/docs/latex/wx/renderer.tex b/docs/latex/wx/renderer.tex
index ab71f3b2f2..88f6923d74 100644
--- a/docs/latex/wx/renderer.tex
+++ b/docs/latex/wx/renderer.tex
@@ -89,6 +89,10 @@ No base class
 
 <wx/renderer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -132,6 +136,15 @@ rectangle of a drop down button which arrow matches the size you need.
 \arg{flags} may have the \texttt{wxCONTROL\_PRESSED} or \texttt{wxCONTROL\_CURRENT} bit set.
 
 
+\membersection{wxRendererNative::DrawFocusRect}\label{wxrenderernativedrawfocusrect}
+
+\func{void}{DrawFocusRect}{\param{wxWindow* }{win}, \param{wxDC\& }{dc}, \param{const wxRect\& }{rect}, \param{int }{flags = 0}}
+
+Draw a focus rectangle using the specified rectangle.
+\helpref{wxListCtrl}{wxlistctrl}. The only supported flags is 
+\texttt{wxCONTROL\_SELECTED} for items which are selected.
+
+
 \membersection{wxRendererNative::DrawHeaderButton}\label{wxrenderernativedrawheaderbutton}
 
 \func{int}{DrawHeaderButton}{\param{wxWindow* }{win}, \param{wxDC\& }{dc}, \param{const wxRect\& }{rect}, \param{int }{flags = 0}, \param{wxHeaderSortIconType }{sortArrow = wxHDR\_SORT\_ICON\_NONE}, \param{wxHeaderButtonParams* }{params = NULL}}
