X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8a280d9ad39dd1dc92107dc67c4884c35eed89ac..b79a8705e6a9d82c6b9db66214ee4a3a77bf1525:/docs/latex/wx/font.tex

diff --git a/docs/latex/wx/font.tex b/docs/latex/wx/font.tex
index fa8e18494b..88e178c68a 100644
--- a/docs/latex/wx/font.tex
+++ b/docs/latex/wx/font.tex
@@ -144,7 +144,7 @@ is the encoding set by calls to
 say, KOI8 to create all fonts by default with KOI8 encoding. Initially, the
 default application encoding is the same as default system encoding.}
 \twocolitem{{\bf wxFONTENCODING\_ISO8859\_1...15}}{ISO8859 encodings.}
-\twocolitem{{\bf wxFONTENCODING\_KOI8}}{The standard russian encoding for Internet.}
+\twocolitem{{\bf wxFONTENCODING\_KOI8}}{The standard Russian encoding for Internet.}
 \twocolitem{{\bf wxFONTENCODING\_CP1250...1252}}{Windows encodings similar to ISO8859 (but not identical).}
 \end{twocollist}
 If the specified encoding isn't available, no font is created.
@@ -153,7 +153,7 @@ If the specified encoding isn't available, no font is created.
 \wxheading{Remarks}
 
 If the desired font does not exist, the closest match will be chosen.
-Under Windows, only scaleable TrueType fonts are used.
+Under Windows, only scalable TrueType fonts are used.
 
 See also \helpref{wxDC::SetFont}{wxdcsetfont}, \helpref{wxDC::DrawText}{wxdcdrawtext}
 and \helpref{wxDC::GetTextExtent}{wxdcgettextextent}.
