X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8941fa8806ad22825b13367a0b48f889f177fe90..792626ca3da21ce4c64c56376e3702b0355fde72:/docs/latex/wx/checkbox.tex

diff --git a/docs/latex/wx/checkbox.tex b/docs/latex/wx/checkbox.tex
index a47d108e16..b682c8fb73 100644
--- a/docs/latex/wx/checkbox.tex
+++ b/docs/latex/wx/checkbox.tex
@@ -146,7 +146,7 @@ This is just a maybe more readable synonym for
 
 \membersection{wxCheckBox::SetValue}\label{wxcheckboxsetvalue}
 
-\func{void}{SetValue}{\param{const bool}{ state}}
+\func{void}{SetValue}{\param{bool}{ state}}
 
 Sets the checkbox to the given state. This does not cause a
 wxEVT\_COMMAND\_CHECKBOX\_CLICKED event to get emitted.
