X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/88ac883a0d005437c97a60d8195bd5e4719b1154..a123dde717aa5a63d2416010456741a009be1d6c:/docs/latex/wx/progdlg.tex?ds=sidebyside

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index bf9d6c87a3..2ec695b050 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -57,6 +57,9 @@ window only.
 \twocolitem{wxPD\_CAN\_ABORT}{This flag tells the dialog that it should have a
     "Cancel" button which the user may press. If this happens, the next call to 
     \helpref{Update()}{wxprogressdialogupdate} will return FALSE.}
+\twocolitem{wxPD\_ELAPSED\_TIME}{This flag tells the dialog that it should show elapsed time (since creating the dialog).}
+\twocolitem{wxPD\_ESTIMATED\_TIME}{This flag tells the dialog that it should show estimated time.}
+\twocolitem{wxPD\_REMAINING\_TIME}{This flag tells the dialog that it should show remaining time.}
 \end{twocollist}%
 }
 
