X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/884360bc11fe926bf91b23215bae719b562df91b..6ed8156e8ac28d5edabcb19a0213f3969955ebd5:/docs/latex/wx/imaglist.tex

diff --git a/docs/latex/wx/imaglist.tex b/docs/latex/wx/imaglist.tex
index a1f79912d9..9fcf045a69 100644
--- a/docs/latex/wx/imaglist.tex
+++ b/docs/latex/wx/imaglist.tex
@@ -12,6 +12,10 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/imaglist.h>
+
 \wxheading{See also}
 
 \helpref{wxTreeCtrl}{wxtreectrl}, \helpref{wxListCtrl}{wxlistctrl}
@@ -24,7 +28,7 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 Default constructor.
 
-\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
+\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = true},\rtfsp
 \param{int }{initialCount = 1}}
 
 Constructor specifying the image size, whether image masks should be created, and the initial size of the list.
@@ -35,7 +39,7 @@ Constructor specifying the image size, whether image masks should be created, an
 
 \docparam{height}{Height of the images in the list.}
 
-\docparam{mask}{TRUE if masks should be created for all images.}
+\docparam{mask}{true if masks should be created for all images.}
 
 \docparam{initialCount}{The initial size of the list.}
 
@@ -75,9 +79,17 @@ The new zero-based image index.
 
 The original bitmap or icon is not affected by the {\bf Add} operation, and can be deleted afterwards.
 
+\pythonnote{In place of a single overloaded method name, wxPython
+implements the following methods:\par
+\indented{2cm}{\begin{twocollist}
+\twocolitem{{\bf Add(bitmap, mask=wxNullBitmap)}}{}
+\twocolitem{{\bf AddWithColourMask(bitmap, colour)}}{}
+\twocolitem{{\bf AddIcon(icon)}}{}
+\end{twocollist}}
+}
 \membersection{wxImageList::Create}\label{wximagelistcreate}
 
-\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
+\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = true},\rtfsp
 \param{int }{initialCount = 1}}
 
 Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr} for details.
@@ -86,7 +98,7 @@ Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr}
 
 \func{bool}{Draw}{\param{int}{ index}, \param{wxDC\&}{ dc}, \param{int }{x},\rtfsp
 \param{int }{x}, \param{int }{flags = wxIMAGELIST\_DRAW\_NORMAL},\rtfsp
-\param{const bool }{solidBackground = FALSE}}
+\param{const bool }{solidBackground = false}}
 
 Draws a specified image onto a device context.
 
@@ -106,7 +118,7 @@ Draws a specified image onto a device context.
 \twocolitem{{\bf wxIMAGELIST\_DRAW\_NORMAL}}{Draw the image normally.}
 \twocolitem{{\bf wxIMAGELIST\_DRAW\_TRANSPARENT}}{Draw the image with transparency.}
 \twocolitem{{\bf wxIMAGELIST\_DRAW\_SELECTED}}{Draw the image in selected state.}
-\twocolitem{{\bf wxIMAGELIST\_DRAW\_FOCUSED}}{Draw the image in a focussed state.}
+\twocolitem{{\bf wxIMAGELIST\_DRAW\_FOCUSED}}{Draw the image in a focused state.}
 \end{twocollist}
 }
 
@@ -119,6 +131,26 @@ that the background is solid.}
 
 Returns the number of images in the list.
 
+\membersection{wxImageList::GetSize}\label{wximagelistgetsize}
+
+\constfunc{bool}{GetSize}{\param{int }{index}, \param{int\& }{width}, \param{int \&}{height}}
+
+Retrieves the size of the images in the list. Currently, the {\it index} 
+parameter is ignored as all images in the list have the same size.
+
+\wxheading{Parameters}
+
+\docparam{index}{currently unused, should be 0}
+
+\docparam{width}{receives the width of the images in the list}
+
+\docparam{height}{receives the height of the images in the list}
+
+\wxheading{Return value}
+
+true if the function succeeded, false if it failed (for example, if the image
+list was not yet initialized).
+
 \membersection{wxImageList::Remove}\label{wximagelistremove}
 
 \func{bool}{Remove}{\param{int}{ index}}
@@ -151,10 +183,12 @@ Replaces the existing image with the new image.
 
 \wxheading{Return value}
 
-TRUE if the replacement was successful, FALSE otherwise.
+true if the replacement was successful, false otherwise.
 
 \wxheading{Remarks}
 
 The original bitmap or icon is not affected by the {\bf Replace} operation, and can be deleted afterwards.
 
+\pythonnote{The second form is called {\tt ReplaceIcon} in wxPython.}
+
 
