X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/882bf210131ea9bf081ee2bb3ce659b6156d7efd..819451b6c76bdcaf5fd8865479209859511aa986:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 314f6af404..162d9018ad 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -53,8 +53,10 @@ of a "separator" is a vertical line under Windows95 vs. simple space under GTK e
 \twocolitem{\windowstyle{wxTB\_VERTICAL}}{Specifies vertical layout (not available for the GTK and Windows 95
 toolbar).}
 \twocolitem{\windowstyle{wxTB\_3DBUTTONS}}{Gives wxToolBarSimple a mild 3D look to its buttons.}
-\twocolitem{\windowstyle{wxTB\_TEXT}}{Show the text in the toolbar buttons, by default only icons are shown}
-\twocolitem{\windowstyle{wxTB\_NOICONS}}{Doesn't show the icons in the toolbar buttons, by default they are shown}
+\twocolitem{\windowstyle{wxTB\_TEXT}}{Show the text in the toolbar buttons; by default only icons are shown.}
+\twocolitem{\windowstyle{wxTB\_NOICONS}}{Specifies no icons in the toolbar buttons; by default they are shown.}
+\twocolitem{\windowstyle{wxTB\_NODIVIDER}}{Specifies no divider above the toolbar; by default it is shown. Windows only.}
+\twocolitem{\windowstyle{wxTB\_NOALIGN}}{Specifies no alignment with the parent window. Windows only.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}. Note that the Win32
@@ -184,9 +186,12 @@ Adds a separator for spacing groups of tools.
 \param{const wxString\& }{longHelpString = ""},\rtfsp
 \param{wxObject* }{clientData = NULL}}
 
+\func{wxToolBarTool*}{AddTool}{\param{wxToolBarTool* }{tool}}
+
 Adds a tool to the toolbar. The first (short and most commonly used) version
 has fewer parameters than the full version at the price of not being able to
-specify some of the more rarely used button features.
+specify some of the more rarely used button features. The last version allows
+to add an existing tool.
 
 \wxheading{Parameters}
 
@@ -215,6 +220,8 @@ parent frame when the mouse pointer is inside the tool}
 \docparam{clientData}{An optional pointer to client data which can be
 retrieved later using \helpref{wxToolBar::GetToolClientData}{wxtoolbargettoolclientdata}.}
 
+\docparam{tool}{The tool to be added.}
+
 \wxheading{Remarks}
 
 After you have added tools to a toolbar, you must call \helpref{wxToolBar::Realize}{wxtoolbarrealize} in
@@ -280,7 +287,7 @@ back later), you may use \helpref{RemoveTool}{wxtoolbarremovetool} instead.
 Note that it is unnecessary to call \helpref{Realize}{wxtoolbarrealize} for the
 change to take place, it will happen immediately.
 
-Returns TRUE if the tool was deleted, FALSE otherwise.
+Returns true if the tool was deleted, false otherwise.
 
 \wxheading{See also}
 
@@ -303,7 +310,7 @@ Enables or disables the tool.
 
 \docparam{toolId}{Tool to enable or disable.}
 
-\docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
+\docparam{enable}{If true, enables the tool, otherwise disables it.}
 
 {\bf NB:} This function should only be called after 
 \helpref{Realize}{wxtoolbarrealize}.
@@ -318,6 +325,13 @@ will change the visible state of the tool to indicate that it is disabled.
 \helpref{wxToolBar::GetToolEnabled}{wxtoolbargettoolenabled},\rtfsp
 \helpref{wxToolBar::ToggleTool}{wxtoolbartoggletool}
 
+\membersection{wxToolBar::FindControl}\label{wxtoolbarfindcontrol}
+
+\func{wxControl*}{FindControl}{\param{int }{id}}
+
+Returns a pointer to the control identified by {\it id} or
+NULL if no corresponding control is found.
+
 \membersection{wxToolBar::FindToolForPosition}\label{wxtoolbarfindtoolforposition}
 
 \constfunc{wxToolBarTool*}{FindToolForPosition}{\param{const float}{ x}, \param{const float}{ y}}
@@ -402,7 +416,7 @@ Called to determine whether a tool is enabled (responds to user input).
 
 \wxheading{Return value}
 
-TRUE if the tool is enabled, FALSE otherwise.
+true if the tool is enabled, false otherwise.
 
 \wxheading{See also}
 
@@ -470,7 +484,7 @@ Gets the on/off state of a toggle tool.
 
 \wxheading{Return value}
 
-TRUE if the tool is toggled on, FALSE otherwise.
+true if the tool is toggled on, false otherwise.
 
 \wxheading{See also}
 
@@ -506,9 +520,12 @@ You must call \helpref{Realize}{wxtoolbarrealize} for the change to take place.
 
 \func{wxToolBarTool *}{InsertTool}{\param{size\_t }{pos},\rtfsp
 \param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
-\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
+\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = false},\rtfsp
 \param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
 
+\func{wxToolBarTool *}{InsertTool}{\param{size\_t }{pos},\rtfsp
+\param{wxToolBarTool* }{tool}}
+
 Inserts the tool with the specified attributes into the toolbar at the given
 position.
 
@@ -533,11 +550,11 @@ you should use the EVT\_MENU or EVT\_TOOL macro instead.
 
 \docparam{toolId}{The identifier passed to \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}.}
 
-\docparam{toggleDown}{TRUE if the tool is a toggle and the toggle is down, otherwise is FALSE.}
+\docparam{toggleDown}{true if the tool is a toggle and the toggle is down, otherwise is false.}
 
 \wxheading{Return value}
 
-If the tool is a toggle and this function returns FALSE, the toggle
+If the tool is a toggle and this function returns false, the toggle
 toggle state (internal and visual) will not be changed. This provides a way of
 specifying that toggle operations are not permitted in some circumstances.
 
@@ -668,7 +685,7 @@ and not the eventual size of the tool button.
 
 \membersection{wxToolBar::SetToolClientData}\label{wxtoolbarsettoolclientdata}
 
-\func{void}{GetToolClientData}{\param{wxObject* }{clientData}}
+\func{void}{SetToolClientData}{\param{int }{id}, \param{wxObject* }{clientData}}
 
 Sets the client data associated with the tool.
 
@@ -756,7 +773,7 @@ Toggles a tool on or off. This does not cause any event to get emitted.
 
 \docparam{toolId}{Tool in question.}
 
-\docparam{toggle}{If TRUE, toggles the tool on, otherwise toggles it off.}
+\docparam{toggle}{If true, toggles the tool on, otherwise toggles it off.}
 
 \wxheading{Remarks}
 
