X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/87b6002d7c48dea4ebd53bbf60996d1a87a0a5c6..5125ea1f83ee0b64c6e26c17823f6e389f7b633f:/docs/latex/wx/thread.tex?ds=inline

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index 8d16307390..1559443b69 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -62,7 +62,7 @@ The possible values for {\it kind} parameters are:
 \end{twocollist}
 
 
-\membersection{wxThread::\destruct{wxThread}}
+\membersection{wxThread::\destruct{wxThread}}\label{wxthreaddtor}
 
 \func{}{\destruct{wxThread}}{\void}
 
@@ -203,11 +203,10 @@ The following priorities are defined:
 
 Returns \true if the thread is alive (i.e. started and not terminating).
 
-Note that this function can only be saely used with joinable threads, not
+Note that this function can only safely be used with joinable threads, not
 detached ones as the latter delete themselves and so when the real thread is
-not alive any longer it is not possible to call this function neither because
-the wxThread object doesn't exist any more as well.
-
+no longer alive, it is not possible to call this function because
+the wxThread object no longer exists.
 
 \membersection{wxThread::IsDetached}\label{wxthreadisdetached}
 
