X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..fc715b5088d317ad09cad84f0d9d375bfac055fd:/docs/latex/wx/strtotxt.tex

diff --git a/docs/latex/wx/strtotxt.tex b/docs/latex/wx/strtotxt.tex
index 8b0e7de771..08219a2dda 100644
--- a/docs/latex/wx/strtotxt.tex
+++ b/docs/latex/wx/strtotxt.tex
@@ -62,7 +62,7 @@ the default parameter value to the text control {\it text}.
 
 \wxheading{Parameters}
 
-\docparam{text}{The text control to append output too, must be non NULL}
+\docparam{text}{The text control to append output too, must be non-NULL}
 
 \docparam{ostr}{The C++ stream to redirect, {\it cout} is used if it is NULL}
 
