X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..ab9717339232a7a728dea666c59b73fd6ac78dd3:/docs/latex/wx/sizeevt.tex

diff --git a/docs/latex/wx/sizeevt.tex b/docs/latex/wx/sizeevt.tex
index 096ad48e59..4bcdef0ad9 100644
--- a/docs/latex/wx/sizeevt.tex
+++ b/docs/latex/wx/sizeevt.tex
@@ -35,6 +35,10 @@ may need to call \helpref{wxWindow::Refresh}{wxwindowrefresh} to invalidate the
 
 <wx/event.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To process a size event, use this event handler macro to direct input to a member
