X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..a245fd31a60b7c222a84c80d528a253e163ccb43:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index f96989dde2..bf881205c6 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -215,7 +215,7 @@ Returns the pointer to the active log target (may be NULL).
 \func{static wxLog *}{SetActiveTarget}{\param{wxLog * }{ logtarget}}
 
 Sets the specified log target as the active one. Returns the pointer to the
-previous active log target (may be NULL).  To supress logging use a new
+previous active log target (may be NULL).  To suppress logging use a new
 instance of wxLogNull not NULL.  If the active log target is set to NULL a
 new default log target will be created when logging occurs.
 
