X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..8d7d6deac6086ebdd1a985518e3c4ab27ece7530:/docs/latex/wx/cmdlpars.tex?ds=sidebyside

diff --git a/docs/latex/wx/cmdlpars.tex b/docs/latex/wx/cmdlpars.tex
index e471321c42..35d1ab1178 100644
--- a/docs/latex/wx/cmdlpars.tex
+++ b/docs/latex/wx/cmdlpars.tex
@@ -453,7 +453,7 @@ Add a parameter of the given {\it type} to the command line description.
 
 Parse the command line, return $0$ if ok, $-1$ if {\tt "-h"} or {\tt "--help"} 
 option was encountered and the help message was given or a positive value if a
-syntax error occured.
+syntax error occurred.
 
 \wxheading{Parameters}
 
