X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..6d3c4b2aee2a64ba3245f2cec9751e4608a9bc3c:/docs/latex/wx/dynlib.tex?ds=sidebyside

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index a47d026205..f29e1ca6d1 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -147,6 +147,7 @@ be a combination of the following bits:
 \twocolitem{wxDL\_GLOBAL}{equivalent of RTLD\_GLOBAL under Unix, ignored elsewhere}
 \twocolitem{wxDL\_VERBATIM}{don't try to append the appropriate extension to
 the library name (this is done by default).}
+\twocolitem{wxDL\_DEFAULT}{default flags, same as wxDL\_NOW currently}
 \end{twocollist}
 
 Returns \true if the library was successfully loaded, \false otherwise.
