X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/recguard.tex

diff --git a/docs/latex/wx/recguard.tex b/docs/latex/wx/recguard.tex
index a02c56b653..7f1f3b4b81 100644
--- a/docs/latex/wx/recguard.tex
+++ b/docs/latex/wx/recguard.tex
@@ -12,7 +12,7 @@
 \section{\class{wxRecursionGuard}}\label{wxrecursionguard}
 
 wxRecursionGuard is a very simple class which can be used to prevent reentrancy
-problems in a function. It is not thread-safe and so should be used only in the
+problems in a function. It is not thread-safe and so should be used only in
 single-threaded programs or in combination with some thread synchronization
 mechanisms.
 
@@ -49,6 +49,10 @@ No base class
 
 <wx/recguard.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
